INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('c521855c-cd88-4ecb-8f1c-853991592d45', 'rq_js_jcd_rel', '2023-12-21 23:26:16.2', '燃气监测点关系同步');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('c39674dd-4928-42b8-8d33-96cb85657e89', 'gs_js_jcd_rel', '2023-12-21 23:26:17.729', '供水监测点关系同步');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('7752cede-bb2c-4e40-b588-4c78eedc0b5f', 'ql_js_jcd_rel', '2023-12-21 23:26:18.02', '桥梁监测点关系同步');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('11712aee-520d-4705-8537-3cedb06b841a', 'ps_js_cz', '2023-12-20 19:56:43.954', '排水场站(设备设施)');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('3f8418ff-95a0-47cf-9992-615356870a0a', 'ps_js_txss', '2023-12-20 19:56:34.501', '调蓄设施(设备设施)');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('dcead611-3e8f-4fd9-943a-d3f744f74843', 'rq_js_cz', '2023-11-10 09:55:13.121', '燃气场站(设备设施)');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('3ae6c43c-3e65-44dc-a221-8c5f713ffd9d', 'sg_js_jcd_rel', '2023-12-21 23:26:18.089', '第三方施工监测点关系同步');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('1195371357949394944', 'rq_jc_spjk', '2023-12-15 20:08:43.664', '本次更新<rq_jc_spjk>,新增0条,修改0条,失败0条.');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('1195371358180081664', 'dl_jc_spjk', '2023-12-18 00:00:00', '本次更新<dl_jc_spjk>,新增0条,修改0条,失败0条.');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('a09d73d0-fb58-481c-a600-0fabe16a2a60', 'rq_jg_zgjl', NULL, '整改记录属性结构表');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('d47623a2-1dde-449b-929b-2fb1a21fe60b', 'sg_jg_dsfsglhcj', NULL, '第三方施工联合惩戒属性结构表');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('5d8234f7-a7d2-489c-a8c6-9c35e07e4285', 'rq_js_jcd', NULL, '燃气监测点属性结构表');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('f8a46b15-6cbe-458b-acdf-bbf5e318dfcb', 'sg_js_jcd', NULL, '第三方施工监测点属性结构表');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('9f41020b-e698-42b3-b01f-b383d13256d8', 'sg_jg_dsfsgphczjg', NULL, '第三方施工破坏处置结果属性结构表');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('b37e46c6-ff51-4bbd-80c7-12fc0721c383', 'ql_js_jcd', NULL, '桥梁监测点属性结构表');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('1174308594829492224', 'VideoChannel', NULL, '本次更新<VideoChannel>,新增0条,修改0条,失败0条.');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('e0407d9b-a8f8-483a-99b1-619a18db98eb', 'rq_jg_fxpg', '2023-12-15 19:46:34.11', '燃气风险');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('1793632f-d250-4b7f-9a58-1f448d3ddd57', 'gs_jg_gwfxhczxx', '2023-12-20 19:15:21.169', '供水风险');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('a2a91bef-8642-4f53-8941-f3ddf1a6d9c8', 'ps_js_jcd_rel', '2023-12-21 23:26:17.844', '排水监测点关系同步');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('1195372114958352384', 'ql_jc_spjk', '2023-12-18 00:00:00', '本次更新<ql_jc_spjk>,新增0条,修改0条,失败0条.');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('1195372115260342272', 'sg_jc_spjk', '2023-09-26 15:22:35.373', '本次更新<sg_jc_spjk>,新增0条,修改0条,失败0条.');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('f0798396-77e8-46fe-94d0-4f9e67657b72', 'rq_js_rqyh', NULL, '燃气用户');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('8e0d3a65-2087-4bf8-b987-f05667a70573', 'gs_jc_jcyj', NULL, '供水监测预警');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('2623d870-6593-407d-8763-714db9127a55', 'ps_jc_jcxyz', '2023-12-13 16:17:32.942', '排水监测项阈值');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('21d7p238-cf7ra121-933d-85a80ba94098', 'del_rq_jg_jhxm', NULL, '燃气计划项目属性结构表');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('0d918f7d-08bb-4bdc-8a74-cf6887b91d46', 'dl_jc_dltxyh', NULL, '道路塌陷隐患属性结构表');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('516082e1-c489-4867-b4e7-c8f9e7a88bb0', 'ps_js_gd', NULL, '排水管点(设备设施)');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('975f9f3e-d228-4dc0-b24a-9fe81dd15e16', 'rq_js_gx', NULL, '燃气管线(设备设施)');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('b3eb43f3-3f5a-44cd-b138-71f4dbc51ac1', 'rq_js_gd', NULL, '燃气管点(设备设施)');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('85cc9347-1f5b-4e51-bda5-866596d842b0', 'rq_jg_aqzxjcjl', NULL, '安全专项检查记录');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('1d1671df-efba-4591-86dd-ef5d753605a3', 'gs_jc_jcsb', '2023-12-20 18:56:07.922', '供水监测设备属性结构表');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('4ebfd836-8dd8-4af1-b75a-5e024f908214', 'rq_jg_lhjcjl', NULL, '安全专项检查记录');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('067fac35-8a14-4ed4-9dcf-ff81b064110b', 'gs_jc_jcxyz', '2023-12-20 22:02:18.46', '供水监测项阈值');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('cebed4cc-f78f-4d8c-bca3-a086f5b07cec', 'sg_jc_jcsb', '2023-12-20 19:04:00.943', '第三方施工监测设备属性结构表');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('a1d4bfa7-fd40-3e7e-9bed-515092732181', 'sg_jg_dsfsgxmxx', NULL, '第三方施工项目信息');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('1d42fa27-24ab-42c9-be23-3b6d3d78489e', 'zy_js_ck', NULL, '应急仓库');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('d92d92af-5368-4fba-894e-5971dd079fd4', 'zy_js_yjwz', NULL, '应急物资');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('ecca616a-4a4c-4e30-954a-f03293fac6cc', 'zy_js_yjzj', NULL, '应急专家');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('50695049-8062-4e3a-929f-eff5bd44a5c7', 'ps_jg_ysfxgk', '2023-12-20 19:56:44.924', '内涝风险');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('8f3977f0-932d-11ee-9d30-00163e0d9136', 'ps_js_yld', '2023-12-20 19:56:37.881', '内涝风险-易涝点');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('a5b2c129-6bb8-4591-9edc-a8d0ab519b61', 'dl_jc_dltxfx', NULL, '道路塌陷风险');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('428fedae-d402-4771-8981-604534304dc4', 'ps_js_jcd', NULL, '排水监测点属性结构表');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('6a3f2679-cc25-4309-96f7-967d01241806', 'dl_jg_jhxm', NULL, '道路计划项目');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('55ef5dba-7e5b-47ed-877a-1cd3c847621d', 'del_gs_jg_tfsjqx', NULL, '供水突发事件');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('b1b8446b-82e3-4aa8-a221-91910f19a674', 'ql_jc_jcsb', '2023-12-16 18:26:17.374059', '桥梁监测设备属性结构表');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('21b2ad15-4425-449c-ae7a-35a0834286be', 'gs_js_cz', '2023-12-20 19:15:21.539', '供水厂站(设备设施)');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('6c6613c3-2301-4d4e-a095-ff622a2d8ce9', 'ps_js_pk', '2023-12-20 19:56:44', '排水排口(设备设施)');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('c6ba9525-73e9-4b82-980f-e9e7c5a40a56', 'ps_js_psh', '2023-12-20 19:56:45.438', '重点排水户属性结构表');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('8dabac33-6a69-49fb-99a5-e52ae61b604e', 'ql_js_ql', '2023-12-20 18:26:13.174', '桥梁属性结构表');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('f37b232b-6295-4ca1-aae7-dfdb21f1f13a', 'rq_jc_jcsb', '2023-12-20 20:02:55.704', '燃气监测设备属性结构表');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('f06e6c95-9325-4b05-91a4-5b802dfeeef0', 'rq_jc_jcxyz', '2023-08-29 14:05:00', '燃气监测项阈值');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('7780b167-29c3-47eb-82d8-c90f5785e07d', 'ps_jc_jcsb', '2023-12-20 19:56:42.346', '排水监测设备属性结构表');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('f6bf9c41-7461-4418-a6e6-89ebe1419ed3', 'ql_jg_fxpg', NULL, '桥梁风险');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('e450cd36-f6ea-45dc-a426-9850e33d772d', 'del_dl_jg_tfsjqx', NULL, '道路突发事件');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('56d7e238-cf3ra532-911d-85a80ba96547', 'ql_jg_jhxm', NULL, '桥梁计划项目属性结构表');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('f93c4c86-3919-4f4d-8fe3-ed7477ff2565', 'rq_jc_rqssyh', NULL, '燃气隐患');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('1195372114522144768', 'ps_jc_spjk', NULL, '本次更新<ps_jc_spjk>,新增0条,修改0条,失败0条.');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('d8749b68-588a-465b-8f18-68bcd0302373', 'del_ql_jg_tfsjqx', NULL, '桥梁突发事件');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('a435044c-4968-4810-b64d-ddedfa9e7112', 'ps_jg_jhxm', NULL, '排水计划项目');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('01d4bfa7-fd40-4e7e-9bed-51509273218e', 'zh_jg_jhxm', NULL, '管线计划项目');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('0ba75d33-41ce-4630-a682-1bdc158195cf', 'ps_js_gx', NULL, '排水管线(设备设施)');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('dd93f17f-9175-432b-ae81-3ebc78d362c1', 'del_rq_jg_tfsjqx', NULL, '燃气突发事件');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('d639e1b7-1bf9-4eeb-8e6f-df8fc1ea6d44', 'del_ps_jg_tfsjqx', NULL, '排水突发事件');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('12ecc773-39ba-4b4d-ab3e-66c433210938', 'zy_js_ylwsjg', NULL, '医疗卫生机构');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('02738ba4-0409-4a46-ac91-0be1ae7d8c6a', 'sg_jc_jcxyz', '2023-12-20 18:59:04.991', '施工监测项阈值');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('79d73534-6c62-4c94-8a20-3def24241c10', 'rq_jg_jhxm', NULL, '燃气计划项目');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('1f068ae4-9088-4901-9c4c-75c4937a11c6', 'ql_jc_jcxyz', '2023-12-16 18:26:16.071478', '桥梁监测项阈值');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('11we3212-dfv423ds-223wedds-defr432d', 'zy_js_bncs', NULL, '避难场所');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('17d7e238-cf8d-4532-911d-85a80ba95918', 'zy_js_zdwxy', NULL, '重大危险源');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('81022941-2153-4784-b7dd-24f69bcd2cb1', 'ps_js_xxtd', '2023-12-20 19:56:37.655', '行泄通道属性结构表');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('78fc8790-d03a-4204-b2bc-5477987a6c0c', 'dl_js_csdl', '2023-12-20 17:57:12.085', '城市道路属性结构表');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('e4a61429-daeb-4311-9d82-6cbb26748d3f', 'rq_jc_jcyj', NULL, '燃气监测预警');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('519c5d2b-cb36-4183-81c2-8c1d183af03c', 'ps_jc_jcyj', NULL, '排水监测预警');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('116c2306-38b7-447a-8a6f-3ea1142fcbfb', 'ql_jc_jcyj', NULL, '桥梁监测预警');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('dfc2ff3b-0b2f-4e58-a49b-134c1d08f62e', 'zy_js_jydw', NULL, '救援队伍');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('80bd25f1-70e0-46af-a5bc-c1c823d78af8', 'del_ps_js_flyjzy', NULL, '防涝应急资源');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('1f6513c3-2301-4d4e-a095-ff622a2ds35k', 'ps_js_jlss', NULL, '截流设施(设备设施)');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('1174308338230362112', 'IndustrySupervisionScheme', '2024-02-29 00:03:36.99', '本次更新<IndustrySupervisionScheme>,新增0条,修改0条,失败0条.');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('396da78e-b5b5-4ef9-a0c0-11e409744729', 'gs_js_jcd', NULL, '供水监测点属性结构表');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('83b4f8a9-dd19-46a6-8608-f4d16490c5f9', 'ps_js_zyhd', '2023-12-20 19:56:39.285', '主要河道属性结构表');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('c1e13f75-3871-411e-9e39-6c61212eb862', 'gs_jg_jhxm', NULL, '供水计划项目');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('6560a6e8-3bfc-49a2-afd0-fe3485dca11d', 'gs_jg_ljgwgzlsqk', '2023-12-20 19:15:22.99', '老旧管网改造落实情况属性结构表');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('8b85d9c0-9150-4b2c-b369-a56e67f28ec3', 'rq_jg_xjjl', '2023-12-21 20:06:03.383', '燃气巡检记录');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('aba033dd-245a-473b-b589-823c52ce766c', 'gs_jg_xjjl', '2023-12-21 20:06:20.122', '供水巡检记录');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('751abb39-7d92-4e2c-9adb-b491a7a597f0', 'ps_jg_xjjl', '2023-12-21 20:06:23.467', '排水巡检记录');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('33w7e238-cf8d-4532-911d-85a80ba91123', 'sg_jg_dxdaalk', NULL, '第三方施工典型档案案例库属性结构表');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('3877423d-f794-4af4-892c-853c8f4cad97', 'dl_jg_xjjl', '2023-12-21 20:25:01.243', '道路巡检记录');
INSERT INTO "sync_table_time" ("id", "table_name", "last_sync_time", "sync_notes") VALUES ('c1ae8c7a-6368-436c-afd3-77e7ee63a293', 'ql_jg_xjjl', '2023-12-21 20:25:01.536', '桥梁巡检记录');
