INSERT INTO "ps_js_yld" ("bsm", "xzqhdm", "mc", "dz", "fxdj", "dcjyl", "dcjylcxsj", "dczdnlss", "dczdysmj", "dcnlcxsj", "nlzyyy", "dcrq", "qyqkms", "tbdw", "tbrq", "bz", "kjxx", "yskzjbz", "sjtbzt", "tbsj") VALUES ('8', '320206', '惠暨大道南匝道', '惠暨大道南匝道', '3', NULL, NULL, '15', '150', '1', '外河（湖）高水位顶托，排水不畅', '2023-06-19 00:00:00', '外河（湖）高水位顶托，排水不畅', '无锡市照明和排水管理中心', '2023-11-13 00:00:00', NULL, '01010000208A110000C91CCBBBEA105E4023F59ECA69AB3F40', 'YLD007', NULL, NULL);
INSERT INTO "ps_js_yld" ("bsm", "xzqhdm", "mc", "dz", "fxdj", "dcjyl", "dcjylcxsj", "dczdnlss", "dczdysmj", "dcnlcxsj", "nlzyyy", "dcrq", "qyqkms", "tbdw", "tbrq", "bz", "kjxx", "yskzjbz", "sjtbzt", "tbsj") VALUES ('12', '320214', '新友北路', '新友北路', '3', NULL, NULL, '20', '800', '1', '管道或排口堵塞，外河（湖）高水位顶托，排水不畅', '2023-06-19 00:00:00', '外河（湖）高水位顶托，排水不畅', '无锡市照明和排水管理中心', '2023-11-13 00:00:00', NULL, '01010000208A110000A4A65D4C331C5E40016C4084B88E3F40', 'YLD011', NULL, NULL);
INSERT INTO "ps_js_yld" ("bsm", "xzqhdm", "mc", "dz", "fxdj", "dcjyl", "dcjylcxsj", "dczdnlss", "dczdysmj", "dcnlcxsj", "nlzyyy", "dcrq", "qyqkms", "tbdw", "tbrq", "bz", "kjxx", "yskzjbz", "sjtbzt", "tbsj") VALUES ('13', '320214', '旺庄立交下穿通道', '旺庄立交下穿通道', '3', NULL, NULL, '120', '1000', '1', '低洼处设施排水能力不足造成积水', '2023-06-19 00:00:00', '旺庄立交下穿通道最大积水深度100公分，最大积水时间1.5小时。', '无锡市照明和排水管理中心', '2023-11-13 00:00:00', NULL, '01010000208A110000E34F5436AC155E40DFDFA0BDFA883F40', 'YLD012', NULL, NULL);
INSERT INTO "ps_js_yld" ("bsm", "xzqhdm", "mc", "dz", "fxdj", "dcjyl", "dcjylcxsj", "dczdnlss", "dczdysmj", "dcnlcxsj", "nlzyyy", "dcrq", "qyqkms", "tbdw", "tbrq", "bz", "kjxx", "yskzjbz", "sjtbzt", "tbsj") VALUES ('14', '320213', '凤翔立交下穿通道', '凤翔立交下穿通道', '3', NULL, NULL, '100', '1500', '1', '低洼处设施排水能力不足造成积水', '2023-06-19 00:00:00', '凤翔立交最大积水深度120厘米，下穿道路部分交通临时封闭，最大雨后退水时间1小时。', '无锡市照明和排水管理中心', '2023-11-13 00:00:00', NULL, '01010000208A110000E17B7F83F6115E4026A94C31079D3F40', 'YLD013', NULL, NULL);
INSERT INTO "ps_js_yld" ("bsm", "xzqhdm", "mc", "dz", "fxdj", "dcjyl", "dcjylcxsj", "dczdnlss", "dczdysmj", "dcnlcxsj", "nlzyyy", "dcrq", "qyqkms", "tbdw", "tbrq", "bz", "kjxx", "yskzjbz", "sjtbzt", "tbsj") VALUES ('15', '320206', '苏嘉路', '苏嘉路', '3', NULL, NULL, '20', '1200', '2', '外河（湖）高水位顶托，排水不畅', '2023-06-19 00:00:00', '苏嘉路最大积水深度20公分，最大雨后退水时间2.5小时。', '无锡市照明和排水管理中心', '2023-11-13 00:00:00', NULL, '01010000208A1100008463963D090F5E402EC72B103D9D3F40', 'YLD014', NULL, NULL);
INSERT INTO "ps_js_yld" ("bsm", "xzqhdm", "mc", "dz", "fxdj", "dcjyl", "dcjylcxsj", "dczdnlss", "dczdysmj", "dcnlcxsj", "nlzyyy", "dcrq", "qyqkms", "tbdw", "tbrq", "bz", "kjxx", "yskzjbz", "sjtbzt", "tbsj") VALUES ('16', '320214', '金城路纺城大道', '金城路纺城大道', '3', NULL, NULL, '20', '1000', '3', '外河（湖）高水位顶托，排水不畅', '2023-06-19 00:00:00', '金城路纺城大道最大积水深度35公分，最大积水时间3小时。', '无锡市照明和排水管理中心', '2023-11-13 00:00:00', NULL, '01010000208A110000A12DE7525C195E403A05F9D9C8913F40', 'YLD015', NULL, NULL);
INSERT INTO "ps_js_yld" ("bsm", "xzqhdm", "mc", "dz", "fxdj", "dcjyl", "dcjylcxsj", "dczdnlss", "dczdysmj", "dcnlcxsj", "nlzyyy", "dcrq", "qyqkms", "tbdw", "tbrq", "bz", "kjxx", "yskzjbz", "sjtbzt", "tbsj") VALUES ('4', '320299', '南湖大道高浪路口', '南湖大道高浪路口', '3', NULL, NULL, '15', '1000', '1', '低洼处设施排水能力不足造成积水', '2023-06-19 00:00:00', '低洼处设施排水能力不足造成积水', '无锡市照明和排水管理中心', '2023-11-13 00:00:00', NULL, '01010000208A110000137D3ECA88145E40A62BD8463C813F40', 'YLD004', NULL, NULL);
INSERT INTO "ps_js_yld" ("bsm", "xzqhdm", "mc", "dz", "fxdj", "dcjyl", "dcjylcxsj", "dczdnlss", "dczdysmj", "dcnlcxsj", "nlzyyy", "dcrq", "qyqkms", "tbdw", "tbrq", "bz", "kjxx", "yskzjbz", "sjtbzt", "tbsj") VALUES ('5', '320299', '和风路博览中心', '和风路博览中心', '3', NULL, NULL, '15', '1000', '1', '外河（湖）高水位顶托，排水不畅', '2023-06-19 00:00:00', '外河（湖）高水位顶托，排水不畅', '无锡市照明和排水管理中心', '2023-11-13 00:00:00', NULL, '01010000208A11000041D7BE805E145E40F85278D0EC7A3F40', 'YLD005', NULL, NULL);
INSERT INTO "ps_js_yld" ("bsm", "xzqhdm", "mc", "dz", "fxdj", "dcjyl", "dcjylcxsj", "dczdnlss", "dczdysmj", "dcnlcxsj", "nlzyyy", "dcrq", "qyqkms", "tbdw", "tbrq", "bz", "kjxx", "yskzjbz", "sjtbzt", "tbsj") VALUES ('6', '320299', '五湖大道高浪路口', '五湖大道高浪路口', '3', NULL, NULL, '15', '1000', '0', '低洼处设施排水能力不足造成积水', '2023-06-19 00:00:00', '低洼处设施排水能力不足造成积水', '无锡市照明和排水管理中心', '2023-11-13 00:00:00', NULL, '01010000208A110000D2FC31AD4D125E400B992B836A7F3F40', 'YLD006', NULL, NULL);
INSERT INTO "ps_js_yld" ("bsm", "xzqhdm", "mc", "dz", "fxdj", "dcjyl", "dcjylcxsj", "dczdnlss", "dczdysmj", "dcnlcxsj", "nlzyyy", "dcrq", "qyqkms", "tbdw", "tbrq", "bz", "kjxx", "yskzjbz", "sjtbzt", "tbsj") VALUES ('1', '320213', '后西溪', '后西溪', '3', NULL, NULL, '15', '20', '0', '低洼处设施排水能力不足造成积水', '2023-06-19 00:00:00', '低洼处设施排水能力不足造成积水', '无锡市照明和排水管理中心', '2023-11-13 00:00:00', NULL, '01010000208A110000F2B0506B9A125E40A2ED98BA2B933F40', 'YLD001', NULL, NULL);
INSERT INTO "ps_js_yld" ("bsm", "xzqhdm", "mc", "dz", "fxdj", "dcjyl", "dcjylcxsj", "dczdnlss", "dczdysmj", "dcnlcxsj", "nlzyyy", "dcrq", "qyqkms", "tbdw", "tbrq", "bz", "kjxx", "yskzjbz", "sjtbzt", "tbsj") VALUES ('9', '320214', '黄山路立交', '黄山路立交', '3', NULL, NULL, '35', '850', '2', '外河（湖）高水位顶托，排水不畅', '2023-06-19 00:00:00', '外河（湖）高水位顶托，排水不畅', '无锡市照明和排水管理中心', '2023-11-13 00:00:00', NULL, '01010000208A110000B80721205F175E4015A930B610883F40', 'YLD008', NULL, NULL);
INSERT INTO "ps_js_yld" ("bsm", "xzqhdm", "mc", "dz", "fxdj", "dcjyl", "dcjylcxsj", "dczdnlss", "dczdysmj", "dcnlcxsj", "nlzyyy", "dcrq", "qyqkms", "tbdw", "tbrq", "bz", "kjxx", "yskzjbz", "sjtbzt", "tbsj") VALUES ('10', '320214', '新泰路（机场路-长江南路）', '新泰路（机场路-长江南路）', '3', NULL, NULL, '15', '550', '3', '外河（湖）高水位顶托，排水不畅', '2023-06-19 00:00:00', '外河（湖）高水位顶托，排水不畅', '无锡市照明和排水管理中心', '2023-11-13 00:00:00', NULL, '01010000208A110000118E59F624185E406A4B1DE4F5843F40', 'YLD009', NULL, NULL);
INSERT INTO "ps_js_yld" ("bsm", "xzqhdm", "mc", "dz", "fxdj", "dcjyl", "dcjylcxsj", "dczdnlss", "dczdysmj", "dcnlcxsj", "nlzyyy", "dcrq", "qyqkms", "tbdw", "tbrq", "bz", "kjxx", "yskzjbz", "sjtbzt", "tbsj") VALUES ('11', '320214', '城南路
（建发上院）', '城南路
（建发上院）', '3', NULL, NULL, '35', '700', '2', '外河（湖）高水位顶托，排水不畅', '2023-06-19 00:00:00', '外河（湖）高水位顶托，排水不畅', '无锡市照明和排水管理中心', '2023-11-13 00:00:00', NULL, '01010000208A1100003811FDDAFA165E40D55B035B25843F40', 'YLD010', NULL, NULL);
INSERT INTO "ps_js_yld" ("bsm", "xzqhdm", "mc", "dz", "fxdj", "dcjyl", "dcjylcxsj", "dczdnlss", "dczdysmj", "dcnlcxsj", "nlzyyy", "dcrq", "qyqkms", "tbdw", "tbrq", "bz", "kjxx", "yskzjbz", "sjtbzt", "tbsj") VALUES ('7', '320299', '观山路市民中心西门', '观山路市民中心西门', '3', NULL, NULL, '15', '1000', '1', '外河（湖）高水位顶托，排水不畅', '2023-06-19 00:00:00', '外河（湖）高水位顶托，排水不畅', '无锡市照明和排水管理中心', '2023-11-13 00:00:00', NULL, '01010000208A110000F850A2258F135E404776A565A47E3F40', 'YLD016', NULL, NULL);
INSERT INTO "ps_js_yld" ("bsm", "xzqhdm", "mc", "dz", "fxdj", "dcjyl", "dcjylcxsj", "dczdnlss", "dczdysmj", "dcnlcxsj", "nlzyyy", "dcrq", "qyqkms", "tbdw", "tbrq", "bz", "kjxx", "yskzjbz", "sjtbzt", "tbsj") VALUES ('17', '320211', '湖玺庄园总排上游/山水东路（限流器+流量计+液位计）监控站', '湖玺庄园总排上游/山水东路（限流器+流量计+液位计）监控站', '3', NULL, NULL, NULL, NULL, NULL, '存在积水事件', '2023-12-04 00:00:00', '存在积水事件', '经开区', '2023-12-04 00:00:00', NULL, '01010000208A1100001B5FD24C6D0F5E4048E4524C71823F40', 'YLD017', NULL, NULL);
INSERT INTO "ps_js_yld" ("bsm", "xzqhdm", "mc", "dz", "fxdj", "dcjyl", "dcjylcxsj", "dczdnlss", "dczdysmj", "dcnlcxsj", "nlzyyy", "dcrq", "qyqkms", "tbdw", "tbrq", "bz", "kjxx", "yskzjbz", "sjtbzt", "tbsj") VALUES ('18', '320211', '宝界公园总排/山水东路（流量计+液位计）监控站', '宝界公园总排/山水东路（流量计+液位计）监控站', '3', NULL, NULL, NULL, NULL, NULL, '存在积水事件', '2023-12-04 00:00:00', '存在积水事件', '经开区', '2023-12-04 00:00:00', NULL, '01010000208A110000A82B72A03B0F5E40E6CB7FC9A1833F40', 'YLD018', NULL, NULL);
INSERT INTO "ps_js_yld" ("bsm", "xzqhdm", "mc", "dz", "fxdj", "dcjyl", "dcjylcxsj", "dczdnlss", "dczdysmj", "dcnlcxsj", "nlzyyy", "dcrq", "qyqkms", "tbdw", "tbrq", "bz", "kjxx", "yskzjbz", "sjtbzt", "tbsj") VALUES ('19', '320211', '南洋职业技术学院总排上游/山水西路（限流器+液位计）监控站', '南洋职业技术学院总排上游/山水西路（限流器+液位计）监控站', '3', NULL, NULL, NULL, NULL, NULL, '存在积水事件', '2023-12-04 00:00:00', '存在积水事件', '经开区', '2023-12-04 00:00:00', NULL, '01010000208A1100002EACF37B6C0F5E4010583930ED7E3F40', 'YLD019', NULL, NULL);
INSERT INTO "ps_js_yld" ("bsm", "xzqhdm", "mc", "dz", "fxdj", "dcjyl", "dcjylcxsj", "dczdnlss", "dczdysmj", "dcnlcxsj", "nlzyyy", "dcrq", "qyqkms", "tbdw", "tbrq", "bz", "kjxx", "yskzjbz", "sjtbzt", "tbsj") VALUES ('20', '320299', '雨水液位计/经开区/观顺道海岸中心门口', '雨水液位计/经开区/观顺道海岸中心门口', '3', NULL, NULL, NULL, NULL, NULL, '存在积水事件', '2023-12-04 00:00:00', '存在积水事件', '经开区', '2023-12-04 00:00:00', NULL, '01010000208A11000006D34718FA125E40C509D7997E7D3F40', 'YLD020', NULL, NULL);
INSERT INTO "ps_js_yld" ("bsm", "xzqhdm", "mc", "dz", "fxdj", "dcjyl", "dcjylcxsj", "dczdnlss", "dczdysmj", "dcnlcxsj", "nlzyyy", "dcrq", "qyqkms", "tbdw", "tbrq", "bz", "kjxx", "yskzjbz", "sjtbzt", "tbsj") VALUES ('21', '320299', '雨水液位计/经开区/观山路与兴梁道交界上游检查井', '雨水液位计/经开区/观山路与兴梁道交界上游检查井', '3', NULL, NULL, NULL, NULL, NULL, '存在积水事件', '2023-12-04 00:00:00', '存在积水事件', '经开区', '2023-12-04 00:00:00', NULL, '01010000208A110000C118EAE05B145E4024E033B9E87E3F40', 'YLD021', NULL, NULL);
INSERT INTO "ps_js_yld" ("bsm", "xzqhdm", "mc", "dz", "fxdj", "dcjyl", "dcjylcxsj", "dczdnlss", "dczdysmj", "dcnlcxsj", "nlzyyy", "dcrq", "qyqkms", "tbdw", "tbrq", "bz", "kjxx", "yskzjbz", "sjtbzt", "tbsj") VALUES ('22', '320299', '雨水液位计/经开区/观顺道震泽路交叉口', '雨水液位计/经开区/观顺道震泽路交叉口', '3', NULL, NULL, NULL, NULL, NULL, '存在积水事件', '2023-12-04 00:00:00', '存在积水事件', '经开区', '2023-12-04 00:00:00', NULL, '01010000208A110000710C402415135E4071B083BF69793F40', 'YLD022', NULL, NULL);
INSERT INTO "ps_js_yld" ("bsm", "xzqhdm", "mc", "dz", "fxdj", "dcjyl", "dcjylcxsj", "dczdnlss", "dczdysmj", "dcnlcxsj", "nlzyyy", "dcrq", "qyqkms", "tbdw", "tbrq", "bz", "kjxx", "yskzjbz", "sjtbzt", "tbsj") VALUES ('23', '320299', '雨水液位计/经开区/金融六街路口盛捷服务公寓门口', '雨水液位计/经开区/金融六街路口盛捷服务公寓门口', '3', NULL, NULL, NULL, NULL, NULL, '存在积水事件', '2023-12-04 00:00:00', '存在积水事件', '经开区', '2023-12-04 00:00:00', NULL, '01010000208A110000646A2C1066135E40CA641A48757B3F40', 'YLD023', NULL, NULL);
INSERT INTO "ps_js_yld" ("bsm", "xzqhdm", "mc", "dz", "fxdj", "dcjyl", "dcjylcxsj", "dczdnlss", "dczdysmj", "dcnlcxsj", "nlzyyy", "dcrq", "qyqkms", "tbdw", "tbrq", "bz", "kjxx", "yskzjbz", "sjtbzt", "tbsj") VALUES ('24', '320299', '雨水液位计/经开区/观山路与观顺道交叉口', '雨水液位计/经开区/观山路与观顺道交叉口', '3', NULL, NULL, NULL, NULL, NULL, '存在积水事件', '2023-12-04 00:00:00', '存在积水事件', '经开区', '2023-12-04 00:00:00', NULL, '01010000208A1100007FD685EA09135E403CC8A1340A7E3F40', 'YLD024', NULL, NULL);
INSERT INTO "ps_js_yld" ("bsm", "xzqhdm", "mc", "dz", "fxdj", "dcjyl", "dcjylcxsj", "dczdnlss", "dczdysmj", "dcnlcxsj", "nlzyyy", "dcrq", "qyqkms", "tbdw", "tbrq", "bz", "kjxx", "yskzjbz", "sjtbzt", "tbsj") VALUES ('25', '320299', '雨水液位计/经开区/南湖大道和畅路交叉口南侧', '雨水液位计/经开区/南湖大道和畅路交叉口南侧', '3', NULL, NULL, NULL, NULL, NULL, '存在积水事件', '2023-12-04 00:00:00', '存在积水事件', '经开区', '2023-12-04 00:00:00', NULL, '01010000208A1100006F93F1F2AB145E40762354F22F7E3F40', 'YLD025', NULL, NULL);
INSERT INTO "ps_js_yld" ("bsm", "xzqhdm", "mc", "dz", "fxdj", "dcjyl", "dcjylcxsj", "dczdnlss", "dczdysmj", "dcnlcxsj", "nlzyyy", "dcrq", "qyqkms", "tbdw", "tbrq", "bz", "kjxx", "yskzjbz", "sjtbzt", "tbsj") VALUES ('26', '320299', '雨水液位计/经开区/吴都路和五湖大道交叉口北侧', '雨水液位计/经开区/吴都路和五湖大道交叉口北侧', '3', NULL, NULL, NULL, NULL, NULL, '存在积水事件', '2023-12-04 00:00:00', '存在积水事件', '经开区', '2023-12-04 00:00:00', NULL, '01010000208A1100009EF5471D5F125E40B4D79C32A07C3F40', 'YLD026', NULL, NULL);
INSERT INTO "ps_js_yld" ("bsm", "xzqhdm", "mc", "dz", "fxdj", "dcjyl", "dcjylcxsj", "dczdnlss", "dczdysmj", "dcnlcxsj", "nlzyyy", "dcrq", "qyqkms", "tbdw", "tbrq", "bz", "kjxx", "yskzjbz", "sjtbzt", "tbsj") VALUES ('27', '320299', '雨水液位计/经开区/信诚道观山路南八方汇', '雨水液位计/经开区/信诚道观山路南八方汇', '3', NULL, NULL, NULL, NULL, NULL, '存在积水事件', '2023-12-04 00:00:00', '存在积水事件', '经开区', '2023-12-04 00:00:00', NULL, '01010000208A110000CAEB05C2B5125E407FE13C6C077E3F40', 'YLD027', NULL, NULL);
INSERT INTO "ps_js_yld" ("bsm", "xzqhdm", "mc", "dz", "fxdj", "dcjyl", "dcjylcxsj", "dczdnlss", "dczdysmj", "dcnlcxsj", "nlzyyy", "dcrq", "qyqkms", "tbdw", "tbrq", "bz", "kjxx", "yskzjbz", "sjtbzt", "tbsj") VALUES ('2', '320213', '通扬路滨水路', '通扬路滨水路', '3', NULL, NULL, '15', '80', '0', '管道或排口堵塞', '2023-06-19 00:00:00', '管道或排口堵塞', '无锡市照明和排水管理中心', '2023-11-13 00:00:00', NULL, '01010000208A110000A56ABB09BE145E40A51133FB3C8A3F40', 'YLD002', NULL, NULL);
INSERT INTO "ps_js_yld" ("bsm", "xzqhdm", "mc", "dz", "fxdj", "dcjyl", "dcjylcxsj", "dczdnlss", "dczdysmj", "dcnlcxsj", "nlzyyy", "dcrq", "qyqkms", "tbdw", "tbrq", "bz", "kjxx", "yskzjbz", "sjtbzt", "tbsj") VALUES ('3', '320211', '山水东路', '山水东路', '3', NULL, NULL, '15', '100', '2', '低洼处设施排水能力不足造成积水、管道或排口堵塞', '2023-06-19 00:00:00', '低洼处设施排水能力不足造成积水、管道或排口堵塞', '无锡市照明和排水管理中心', '2023-11-13 00:00:00', NULL, '01010000208A110000058A58C4B00F5E40302DEA93DC813F40', 'YLD003', NULL, NULL);
INSERT INTO "ps_js_yld" ("bsm", "xzqhdm", "mc", "dz", "fxdj", "dcjyl", "dcjylcxsj", "dczdnlss", "dczdysmj", "dcnlcxsj", "nlzyyy", "dcrq", "qyqkms", "tbdw", "tbrq", "bz", "kjxx", "yskzjbz", "sjtbzt", "tbsj") VALUES ('28', '320299', '雨水液位计/经开区/吴都路南宝能城天桥南侧', '雨水液位计/经开区/吴都路南宝能城天桥南侧', '3', NULL, NULL, NULL, NULL, NULL, '存在积水事件', '2023-12-04 00:00:00', '存在积水事件', '经开区', '2023-12-04 00:00:00', NULL, '01010000208A110000BC07C2F779135E404C9242B4B17B3F40', 'YLD028', NULL, NULL);
INSERT INTO "ps_js_yld" ("bsm", "xzqhdm", "mc", "dz", "fxdj", "dcjyl", "dcjylcxsj", "dczdnlss", "dczdysmj", "dcnlcxsj", "nlzyyy", "dcrq", "qyqkms", "tbdw", "tbrq", "bz", "kjxx", "yskzjbz", "sjtbzt", "tbsj") VALUES ('29', '320299', '雨水液位计/经开区/瑞景道观山实验幼儿园门口北侧', '雨水液位计/经开区/瑞景道观山实验幼儿园门口北侧', '3', NULL, NULL, NULL, NULL, NULL, '存在积水事件', '2023-12-04 00:00:00', '存在积水事件', '经开区', '2023-12-04 00:00:00', NULL, '01010000208A110000CC43C2D1F7145E407376C8532A803F40', 'YLD029', NULL, NULL);
INSERT INTO "ps_js_yld" ("bsm", "xzqhdm", "mc", "dz", "fxdj", "dcjyl", "dcjylcxsj", "dczdnlss", "dczdysmj", "dcnlcxsj", "nlzyyy", "dcrq", "qyqkms", "tbdw", "tbrq", "bz", "kjxx", "yskzjbz", "sjtbzt", "tbsj") VALUES ('30', '320299', '雨水液位计/经开区/万顺道和周新路交叉口', '雨水液位计/经开区/万顺道和周新路交叉口', '3', NULL, NULL, NULL, NULL, NULL, '存在积水事件', '2023-12-04 00:00:00', '存在积水事件', '经开区', '2023-12-04 00:00:00', NULL, '01010000208A110000F321B745CA115E400A4E82D9B2813F40', 'YLD030', NULL, NULL);
INSERT INTO "ps_js_yld" ("bsm", "xzqhdm", "mc", "dz", "fxdj", "dcjyl", "dcjylcxsj", "dczdnlss", "dczdysmj", "dcnlcxsj", "nlzyyy", "dcrq", "qyqkms", "tbdw", "tbrq", "bz", "kjxx", "yskzjbz", "sjtbzt", "tbsj") VALUES ('31', '320299', '雨水液位计/经开区/南霞路与兴梁道交界积水点上游检查井', '雨水液位计/经开区/南霞路与兴梁道交界积水点上游检查井', '3', NULL, NULL, NULL, NULL, NULL, '存在积水事件', '2023-12-04 00:00:00', '存在积水事件', '经开区', '2023-12-04 00:00:00', NULL, '01010000208A11000059AF6B793A145E40799557DC6F803F40', 'YLD031', NULL, NULL);
INSERT INTO "ps_js_yld" ("bsm", "xzqhdm", "mc", "dz", "fxdj", "dcjyl", "dcjylcxsj", "dczdnlss", "dczdysmj", "dcnlcxsj", "nlzyyy", "dcrq", "qyqkms", "tbdw", "tbrq", "bz", "kjxx", "yskzjbz", "sjtbzt", "tbsj") VALUES ('32', '320299', '雨水液位计/经开区/观山路和立信大道交叉口北侧绿化带上', '雨水液位计/经开区/观山路和立信大道交叉口北侧绿化带上', '3', NULL, NULL, NULL, NULL, NULL, '存在积水事件', '2023-12-04 00:00:00', '存在积水事件', '经开区', '2023-12-04 00:00:00', NULL, '01010000208A1100000128073229135E40BCCA38187A7E3F40', 'YLD032', NULL, NULL);
INSERT INTO "ps_js_yld" ("bsm", "xzqhdm", "mc", "dz", "fxdj", "dcjyl", "dcjylcxsj", "dczdnlss", "dczdysmj", "dcnlcxsj", "nlzyyy", "dcrq", "qyqkms", "tbdw", "tbrq", "bz", "kjxx", "yskzjbz", "sjtbzt", "tbsj") VALUES ('33', '320299', '雨水液位计/经开区/市民中心正大门（上游检查井）', '雨水液位计/经开区/市民中心正大门（上游检查井）', '3', NULL, NULL, NULL, NULL, NULL, '存在积水事件', '2023-12-04 00:00:00', '存在积水事件', '经开区', '2023-12-04 00:00:00', NULL, '01010000208A110000727D3E1BB0135E4020F9E8ACCD7E3F40', 'YLD033', NULL, NULL);
INSERT INTO "ps_js_yld" ("bsm", "xzqhdm", "mc", "dz", "fxdj", "dcjyl", "dcjylcxsj", "dczdnlss", "dczdysmj", "dcnlcxsj", "nlzyyy", "dcrq", "qyqkms", "tbdw", "tbrq", "bz", "kjxx", "yskzjbz", "sjtbzt", "tbsj") VALUES ('34', '320299', '雨水液位计/经开区/和鸣路和立信大道交叉口辅道绿化带', '雨水液位计/经开区/和鸣路和立信大道交叉口辅道绿化带', '3', NULL, NULL, NULL, NULL, NULL, '存在积水事件', '2023-12-04 00:00:00', '存在积水事件', '经开区', '2023-12-04 00:00:00', NULL, '01010000208A110000CFD6DD164E135E408873C3A5197B3F40', 'YLD034', NULL, NULL);
INSERT INTO "ps_js_yld" ("bsm", "xzqhdm", "mc", "dz", "fxdj", "dcjyl", "dcjylcxsj", "dczdnlss", "dczdysmj", "dcnlcxsj", "nlzyyy", "dcrq", "qyqkms", "tbdw", "tbrq", "bz", "kjxx", "yskzjbz", "sjtbzt", "tbsj") VALUES ('35', '320299', '雨水液位计/经开区/吴都路和立德道交叉口', '雨水液位计/经开区/吴都路和立德道交叉口', '3', NULL, NULL, NULL, NULL, NULL, '存在积水事件', '2023-12-04 00:00:00', '存在积水事件', '经开区', '2023-12-04 00:00:00', NULL, '01010000208A110000554C545871135E4001258C06737C3F40', 'YLD035', NULL, NULL);
INSERT INTO "ps_js_yld" ("bsm", "xzqhdm", "mc", "dz", "fxdj", "dcjyl", "dcjylcxsj", "dczdnlss", "dczdysmj", "dcnlcxsj", "nlzyyy", "dcrq", "qyqkms", "tbdw", "tbrq", "bz", "kjxx", "yskzjbz", "sjtbzt", "tbsj") VALUES ('36', '320299', '雨水液位计/经开区/五湖大道和新源路交叉口北侧', '雨水液位计/经开区/五湖大道和新源路交叉口北侧', '3', NULL, NULL, NULL, NULL, NULL, '存在积水事件', '2023-12-04 00:00:00', '存在积水事件', '经开区', '2023-12-04 00:00:00', NULL, '01010000208A1100002E1CA0E54D125E40BAC87CC120803F40', 'YLD036', NULL, NULL);
INSERT INTO "ps_js_yld" ("bsm", "xzqhdm", "mc", "dz", "fxdj", "dcjyl", "dcjylcxsj", "dczdnlss", "dczdysmj", "dcnlcxsj", "nlzyyy", "dcrq", "qyqkms", "tbdw", "tbrq", "bz", "kjxx", "yskzjbz", "sjtbzt", "tbsj") VALUES ('37', '320299', '雨水液位计/经开区/德先路和立德道交叉口南侧', '雨水液位计/经开区/德先路和立德道交叉口南侧', '3', NULL, NULL, NULL, NULL, NULL, '存在积水事件', '2023-12-04 00:00:00', '存在积水事件', '经开区', '2023-12-04 00:00:00', NULL, '01010000208A110000CC3A3CB44A135E402D97FA6AA87F3F40', 'YLD037', NULL, NULL);
INSERT INTO "ps_js_yld" ("bsm", "xzqhdm", "mc", "dz", "fxdj", "dcjyl", "dcjylcxsj", "dczdnlss", "dczdysmj", "dcnlcxsj", "nlzyyy", "dcrq", "qyqkms", "tbdw", "tbrq", "bz", "kjxx", "yskzjbz", "sjtbzt", "tbsj") VALUES ('38', '320299', '污水液位计/经开区/吴都路中海凤凰璟园北侧JW3', '污水液位计/经开区/吴都路中海凤凰璟园北侧JW3', '3', NULL, NULL, NULL, NULL, NULL, '存在积水事件', '2023-12-04 00:00:00', '存在积水事件', '经开区', '2023-12-04 00:00:00', NULL, '01010000208A1100004FFD6F649F145E40127764C80B7D3F40', 'YLD038', NULL, NULL);
INSERT INTO "ps_js_yld" ("bsm", "xzqhdm", "mc", "dz", "fxdj", "dcjyl", "dcjylcxsj", "dczdnlss", "dczdysmj", "dcnlcxsj", "nlzyyy", "dcrq", "qyqkms", "tbdw", "tbrq", "bz", "kjxx", "yskzjbz", "sjtbzt", "tbsj") VALUES ('39', '320299', '雨水液位计/经开区/清舒道和风路交叉口', '雨水液位计/经开区/清舒道和风路交叉口', '3', NULL, NULL, NULL, NULL, NULL, '存在积水事件', '2023-12-04 00:00:00', '存在积水事件', '经开区', '2023-12-04 00:00:00', NULL, '01010000208A1100002A1BB5464D145E4081BC2975617B3F40', 'YLD039', NULL, NULL);
INSERT INTO "ps_js_yld" ("bsm", "xzqhdm", "mc", "dz", "fxdj", "dcjyl", "dcjylcxsj", "dczdnlss", "dczdysmj", "dcnlcxsj", "nlzyyy", "dcrq", "qyqkms", "tbdw", "tbrq", "bz", "kjxx", "yskzjbz", "sjtbzt", "tbsj") VALUES ('40', '320299', '雨水液位计/经开区/具区路南湖大道交叉口（上游检查井）', '雨水液位计/经开区/具区路南湖大道交叉口（上游检查井）', '3', NULL, NULL, NULL, NULL, NULL, '存在积水事件', '2023-12-04 00:00:00', '存在积水事件', '经开区', '2023-12-04 00:00:00', NULL, '01010000208A110000AE421E4F18155E405AFF2B4E5C783F40', 'YLD040', NULL, NULL);
INSERT INTO "ps_js_yld" ("bsm", "xzqhdm", "mc", "dz", "fxdj", "dcjyl", "dcjylcxsj", "dczdnlss", "dczdysmj", "dcnlcxsj", "nlzyyy", "dcrq", "qyqkms", "tbdw", "tbrq", "bz", "kjxx", "yskzjbz", "sjtbzt", "tbsj") VALUES ('41', '320299', '污水液位计/经开区/清舒道具区路交叉口/清舒道JW2', '污水液位计/经开区/清舒道具区路交叉口/清舒道JW2', '3', NULL, NULL, NULL, NULL, NULL, '存在积水事件', '2023-12-04 00:00:00', '存在积水事件', '经开区', '2023-12-04 00:00:00', NULL, '01010000208A1100009325FE1E98145E401275AA725D773F40', 'YLD041', NULL, NULL);
INSERT INTO "ps_js_yld" ("bsm", "xzqhdm", "mc", "dz", "fxdj", "dcjyl", "dcjylcxsj", "dczdnlss", "dczdysmj", "dcnlcxsj", "nlzyyy", "dcrq", "qyqkms", "tbdw", "tbrq", "bz", "kjxx", "yskzjbz", "sjtbzt", "tbsj") VALUES ('42', '320299', '雨水液位计/经开区/南湖大道清源路交叉口上游检查井', '雨水液位计/经开区/南湖大道清源路交叉口上游检查井', '3', NULL, NULL, NULL, NULL, NULL, '存在积水事件', '2023-12-04 00:00:00', '存在积水事件', '经开区', '2023-12-04 00:00:00', NULL, '01010000208A110000876A6607FE145E40F08E089D42793F40', 'YLD042', NULL, NULL);
INSERT INTO "ps_js_yld" ("bsm", "xzqhdm", "mc", "dz", "fxdj", "dcjyl", "dcjylcxsj", "dczdnlss", "dczdysmj", "dcnlcxsj", "nlzyyy", "dcrq", "qyqkms", "tbdw", "tbrq", "bz", "kjxx", "yskzjbz", "sjtbzt", "tbsj") VALUES ('43', '320299', '雨水液位计/经开区/瑞景道吴都路交叉口上游检查井', '雨水液位计/经开区/瑞景道吴都路交叉口上游检查井', '3', NULL, NULL, NULL, NULL, NULL, '存在积水事件', '2023-12-04 00:00:00', '存在积水事件', '经开区', '2023-12-04 00:00:00', NULL, '01010000208A1100003EA1B3D92C155E400142B9A78A7D3F40', 'YLD043', NULL, NULL);
INSERT INTO "ps_js_yld" ("bsm", "xzqhdm", "mc", "dz", "fxdj", "dcjyl", "dcjylcxsj", "dczdnlss", "dczdysmj", "dcnlcxsj", "nlzyyy", "dcrq", "qyqkms", "tbdw", "tbrq", "bz", "kjxx", "yskzjbz", "sjtbzt", "tbsj") VALUES ('44', '320299', '污水液位计/经开区/观山路瑞景道交叉口JW4', '污水液位计/经开区/观山路瑞景道交叉口JW4', '3', NULL, NULL, NULL, NULL, NULL, '存在积水事件', '2023-12-04 00:00:00', '存在积水事件', '经开区', '2023-12-04 00:00:00', NULL, '01010000208A110000F12912A90F155E409CD19BF9717F3F40', 'YLD044', NULL, NULL);
INSERT INTO "ps_js_yld" ("bsm", "xzqhdm", "mc", "dz", "fxdj", "dcjyl", "dcjylcxsj", "dczdnlss", "dczdysmj", "dcnlcxsj", "nlzyyy", "dcrq", "qyqkms", "tbdw", "tbrq", "bz", "kjxx", "yskzjbz", "sjtbzt", "tbsj") VALUES ('45', '320299', '雨水液位计/经开区/震泽路与丰润道交叉口', '雨水液位计/经开区/震泽路与丰润道交叉口', '3', NULL, NULL, NULL, NULL, NULL, '存在积水事件', '2023-12-04 00:00:00', '存在积水事件', '经开区', '2023-12-04 00:00:00', NULL, '01010000208A110000857D9189C1135E404AB64D00E4793F40', 'YLD045', NULL, NULL);
INSERT INTO "ps_js_yld" ("bsm", "xzqhdm", "mc", "dz", "fxdj", "dcjyl", "dcjylcxsj", "dczdnlss", "dczdysmj", "dcnlcxsj", "nlzyyy", "dcrq", "qyqkms", "tbdw", "tbrq", "bz", "kjxx", "yskzjbz", "sjtbzt", "tbsj") VALUES ('46', '320299', '雨水液位计/经开区/南蒋路立德道交叉口南侧', '雨水液位计/经开区/南蒋路立德道交叉口南侧', '3', NULL, NULL, NULL, NULL, NULL, '存在积水事件', '2023-12-04 00:00:00', '存在积水事件', '经开区', '2023-12-04 00:00:00', NULL, '01010000208A1100003861A9CB55135E409B29AFC0D07E3F40', 'YLD046', NULL, NULL);
INSERT INTO "ps_js_yld" ("bsm", "xzqhdm", "mc", "dz", "fxdj", "dcjyl", "dcjylcxsj", "dczdnlss", "dczdysmj", "dcnlcxsj", "nlzyyy", "dcrq", "qyqkms", "tbdw", "tbrq", "bz", "kjxx", "yskzjbz", "sjtbzt", "tbsj") VALUES ('47', '320299', '污水液位计/经开区/贡湖大道与具区路交界/具区路JW1', '污水液位计/经开区/贡湖大道与具区路交界/具区路JW1', '3', NULL, NULL, NULL, NULL, NULL, '存在积水事件', '2023-12-04 00:00:00', '存在积水事件', '经开区', '2023-12-04 00:00:00', NULL, '01010000208A110000D3C34240CD145E40D0B62367A4773F40', 'YLD047', NULL, NULL);
