INSERT INTO "ps_js_psh" ("bsm", "xzqhdm", "sspsxt", "pshmc", "pshdz", "jrjcjbm", "zzjgdm", "lxdh", "zgdw", "pshlx", "sfwzdpsh", "zyscgy", "psxkzbh", "yhzl", "zbsl", "zpsl", "scwsl", "shwsl", "dylwrwmc", "delwrwmc", "wsclfs", "wsclgm", "sjhqrq", "tbdw", "tbrq", "bz", "yskzjbz", "sjtbzt", "tbsj", "kjxx", "mrdb", "xkzffrq", "jszlwjs", "jly") VALUES ('2', '320214', '太湖新城污水处理厂', '华进公司年封装测试2500万颗半导体产品的先进封装与系统集成升级改造项目', '景贤路以北、运河西路以西', NULL, NULL, '18115758378', NULL, '工业企业', '是', NULL, '6671', NULL, NULL, '32', NULL, '32', NULL, NULL, NULL, NULL, NULL, '无锡市照明和排水管理中心', '2023/11/13', NULL, '2', NULL, NULL, 'SRID=4490;POINT(120.363473 31.507505)', '叶甜春', NULL, NULL, NULL);
INSERT INTO "ps_js_psh" ("bsm", "xzqhdm", "sspsxt", "pshmc", "pshdz", "jrjcjbm", "zzjgdm", "lxdh", "zgdw", "pshlx", "sfwzdpsh", "zyscgy", "psxkzbh", "yhzl", "zbsl", "zpsl", "scwsl", "shwsl", "dylwrwmc", "delwrwmc", "wsclfs", "wsclgm", "sjhqrq", "tbdw", "tbrq", "bz", "yskzjbz", "sjtbzt", "tbsj", "kjxx", "mrdb", "xkzffrq", "jszlwjs", "jly") VALUES ('1', '320299', '太湖新城污水处理厂', '无锡华美集团有限公司', '无锡市华清路113号', NULL, NULL, '85620687', NULL, '工业企业', '是', NULL, '644', NULL, NULL, '95', NULL, '95', NULL, NULL, NULL, NULL, NULL, '无锡市照明和排水管理中心', '2023/11/13', NULL, '1', NULL, NULL, 'SRID=4490;POINT(120.334998 31.509671)', '王敬伦', NULL, NULL, NULL);
