INSERT INTO "ps_jc_jcxyz" ("bsm", "sbbsm", "sblx", "jczb", "bjyz", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('2', 'JCSB002', '液位计', '11.97', '14.312', NULL, 'JCXYZ002', NULL, NULL, 2);
INSERT INTO "ps_jc_jcxyz" ("bsm", "sbbsm", "sblx", "jczb", "bjyz", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('1', 'JCSB001', '液位计', '3.27', '4.430', NULL, 'JCXYZ001', NULL, NULL, 2);
INSERT INTO "ps_jc_jcxyz" ("bsm", "sbbsm", "sblx", "jczb", "bjyz", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('3', 'JCSB003', '液位计', '5.03', '6.533', NULL, 'JCXYZ003', NULL, NULL, 2);
