INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('6580337A00D50EA7FB88219546F00003', '1724313808568553474', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB002', 'I', '2023-12-18 19:56:42.909', 1);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('6580337A00340E7664060D88E6F00000', '1724618506026586114', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB025', 'I', '2023-12-18 19:56:42.909', 1);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('6580337A01A70E1F640C0D88E6F00000', '1723893521883803650', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB008', 'I', '2023-12-18 19:56:42.909', 2);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('6580337A018F0E721AA2E106E6F00005', '1724248422103068674', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB009', 'I', '2023-12-18 19:56:42.909', 1);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('6580337AFD060D0D8BDC251526F00004', '1690925778654932993', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB029', 'I', '2023-12-18 19:56:42.909', 1);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('6580337A00360E4AA1BB2F34E6F00001', '1262341664164974594', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB015', 'I', '2023-12-18 19:56:42.909', 3);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('6580337A00950EAAFB86219546F00003', '1724325928151756802', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB026', 'I', '2023-12-18 19:56:42.909', 1);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('6580337A013B0EFE64080D88E6F00000', '1262341761649778689', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB016', 'I', '2023-12-18 19:56:42.909', 3);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('6580337A01D20E20640E0D88E6F00000', '1723888922724610049', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB011', 'I', '2023-12-18 19:56:42.909', 2);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('6580337AFF9A0DC646A423F096F00002', '1723900506642288641', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB027', 'I', '2023-12-18 19:56:42.909', 1);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('6580337A00D50E7846A823F096F00002', '1724332725516316673', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB004', 'I', '2023-12-18 19:56:42.909', 1);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('6580337A01D30E2E46B423F096F00002', '1724239289220018178', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB019', 'I', '2023-12-18 19:56:42.909', 1);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('6580337A004F0E841A9EE106E6F00005', '1724254192987222018', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB003', 'I', '2023-12-18 19:56:42.909', 1);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('6580337AFD3F0D488BDE251526F00004', '1724599558387478529', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB018', 'I', '2023-12-18 19:56:42.909', 1);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('6580337A01210E89A1BD2F34E6F00001', '1724349247504723970', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB028', 'I', '2023-12-18 19:56:42.909', 1);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('6580337A00980EDE46A623F096F00002', '1724234877555412993', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB001', 'I', '2023-12-18 19:56:42.909', 1);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('6580337A01810E8446B023F096F00002', '1724257560267558913', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB030', 'I', '2023-12-18 19:56:42.909', 1);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('6580337A01EF0E521AA6E106E6F00005', '1724322917576814594', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB021', 'I', '2023-12-18 19:56:42.909', 1);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('6580337A01FC0E4F64100D88E6F00000', '1723904964268888066', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB013', 'I', '2023-12-18 19:56:42.909', 1);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('6580337A012F0E2846AC23F096F00002', '1723898292318212097', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB014', 'I', '2023-12-18 19:56:42.909', 2);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('6580337A01500E8F1AA0E106E6F00005', '1724328080869896194', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB005', 'I', '2023-12-18 19:56:42.909', 1);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('6580337AFC310D628BDA251526F00004', '1723909529864450050', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB010', 'I', '2023-12-18 19:56:42.909', 1);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('6580337AFD6E0D358BE0251526F00004', '1724243436506681346', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB023', 'I', '2023-12-18 19:56:42.909', 1);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('6580337AFF9A0D8AFB84219546F00003', '1724655871675830273', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB024', 'I', '2023-12-18 19:56:42.909', 1);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('6580337A02250E0A64120D88E6F00000', '1724316090672582658', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB022', 'I', '2023-12-18 19:56:42.909', 1);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('6580337A01580E9F46AE23F096F00002', '1262341480002265090', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB017', 'I', '2023-12-18 19:56:42.909', 3);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('6580337A017A0E44640A0D88E6F00000', '1724259849464156161', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB007', 'I', '2023-12-18 19:56:42.909', 1);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('6580337A01040EAB46AA23F096F00002', '1724346812291821569', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB006', 'I', '2023-12-18 19:56:42.909', 1);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('6580337A01AB0E2946B223F096F00002', '1722797526794055681', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB031', 'I', '2023-12-18 19:56:42.909', 2);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('6580337A01FB0EA346B623F096F00002', '1724676785150857217', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB020', 'I', '2023-12-18 19:56:42.909', 1);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('6580337A01C00EE51AA4E106E6F00005', '1723913187164131329', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB012', 'I', '2023-12-18 19:56:42.909', 1);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('658184F96EC300D7BF1703E926F00005', '1724254192987222018', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB003', 'I', '2023-12-19 19:56:41.02', 1);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('658184F97042007CBF1D03E926F00005', '1723913187164131329', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB012', 'I', '2023-12-19 19:56:41.02', 1);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('658184F970A4003211142BD106F00002', '1724257560267558913', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB030', 'I', '2023-12-19 19:56:41.02', 1);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('658184F9717400CD6713066876F00000', '1723904964268888066', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB013', 'I', '2023-12-19 19:56:41.02', 1);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('658184F96B550032F2EB480176F00003', '1724655871675830273', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB024', 'I', '2023-12-19 19:56:41.02', 1);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('658184F96C7F00C9F2EF480176F00003', '1724313808568553474', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB002', 'I', '2023-12-19 19:56:41.02', 1);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('658184F96DF4002E0D2047E956F00004', '1723909529864450050', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB010', 'I', '2023-12-19 19:56:41.02', 1);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('658184F96EEC00BF0D2247E956F00004', '1690925778654932993', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB029', 'I', '2023-12-19 19:56:41.02', 1);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('658184F96F5A00CB0D2647E956F00004', '1724243436506681346', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB023', 'I', '2023-12-19 19:56:41.02', 1);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('658184F96FCF00B0BF1903E926F00005', '1724328080869896194', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB005', 'I', '2023-12-19 19:56:41.02', 1);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('658184F97071006ABF1F03E926F00005', '1724322917576814594', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB021', 'I', '2023-12-19 19:56:41.02', 1);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('658184F9719D004B6715066876F00000', '1724316090672582658', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB022', 'I', '2023-12-19 19:56:41.02', 1);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('658184F96FF90095110C2BD106F00002', '1724332725516316673', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB004', 'I', '2023-12-19 19:56:41.02', 1);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('658184F96FFE005C155C2A74B6F00001', '1724349247504723970', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB028', 'I', '2023-12-19 19:56:41.02', 1);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('658184F96FBB0006110A2BD106F00002', '1724234877555412993', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB001', 'I', '2023-12-19 19:56:41.02', 1);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('658184F970D700D211162BD106F00002', '1722797526794055681', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB031', 'I', '2023-12-19 19:56:41.02', 2);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('658184F9713F0095111A2BD106F00002', '1724676785150857217', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB020', 'I', '2023-12-19 19:56:41.02', 1);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('658184F96C44001FF2ED480176F00003', '1724325928151756802', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB026', 'I', '2023-12-19 19:56:41.02', 1);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('658184F96F2B00220D2447E956F00004', '1724599558387478529', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB018', 'I', '2023-12-19 19:56:41.02', 1);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('658184F9700F00AFBF1B03E926F00005', '1724248422103068674', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB009', 'I', '2023-12-19 19:56:41.02', 1);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('658184F97051007511102BD106F00002', '1723898292318212097', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB014', 'I', '2023-12-19 19:56:41.02', 2);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('658184F97109008111182BD106F00002', '1724239289220018178', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB019', 'I', '2023-12-19 19:56:41.02', 1);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('658184F970B4006A670B066876F00000', '1262341761649778689', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB016', 'I', '2023-12-19 19:56:41.02', 3);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('658184F96F0D0013155A2A74B6F00001', '1262341664164974594', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB015', 'I', '2023-12-19 19:56:41.02', 3);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('658184F96EC3002111082BD106F00002', '1723900506642288641', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB027', 'I', '2023-12-19 19:56:41.02', 1);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('658184F9707A00AE11122BD106F00002', '1262341480002265090', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB017', 'I', '2023-12-19 19:56:41.02', 3);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('658184F96FA600EE6709066876F00000', '1724618506026586114', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB025', 'I', '2023-12-19 19:56:41.02', 1);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('658184F970F10004670D066876F00000', '1724259849464156161', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB007', 'I', '2023-12-19 19:56:41.02', 1);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('658184F971200065670F066876F00000', '1723893521883803650', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB008', 'I', '2023-12-19 19:56:41.02', 2);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('658184F9714A00C56711066876F00000', '1723888922724610049', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB011', 'I', '2023-12-19 19:56:41.02', 2);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('658184F970270067110E2BD106F00002', '1724346812291821569', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB006', 'I', '2023-12-19 19:56:41.02', 1);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('6582D67A68D1054B4A904BE1A6F00003', '1724313808568553474', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB002', 'I', '2023-12-20 19:56:42.346', 1);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('6582D67A680B056677DB4CA986F00004', '1723909529864450050', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB010', 'I', '2023-12-20 19:56:42.346', 1);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('6582D67A67B80507CD0B2CD116F00002', '1723900506642288641', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB027', 'I', '2023-12-20 19:56:42.346', 1);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('6582D67A754105107036078896F00000', '1723904964268888066', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB013', 'I', '2023-12-20 19:56:42.346', 1);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('6582D67A68B80518CD0D2CD116F00002', '1724234877555412993', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB001', 'I', '2023-12-20 19:56:42.346', 1);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('6582D67A744D0522702E078896F00000', '1262341761649778689', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB016', 'I', '2023-12-20 19:56:42.346', 3);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('6582D67A74E505137034078896F00000', '1723888922724610049', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB011', 'I', '2023-12-20 19:56:42.346', 2);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('6582D67A6A0C0523CD192CD116F00002', '1722797526794055681', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB031', 'I', '2023-12-20 19:56:42.346', 2);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('6582D67A6989050FCD152CD116F00002', '1262341480002265090', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB017', 'I', '2023-12-20 19:56:42.346', 3);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('6582D67A69C70590F44606E946F00005', '1724254192987222018', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB003', 'I', '2023-12-20 19:56:42.346', 1);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('6582D67A732905F88FA32F34E6F00001', '1262341664164974594', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB015', 'I', '2023-12-20 19:56:42.346', 3);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('6582D67A74B805147032078896F00000', '1723893521883803650', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB008', 'I', '2023-12-20 19:56:42.346', 2);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('6582D67A690505B077DD4CA986F00004', '1690925778654932993', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB029', 'I', '2023-12-20 19:56:42.346', 1);
INSERT INTO "ps_jc_jcsb" ("bsm", "dwbsm", "sblx", "sbmc", "sbxh", "jczb", "cjpl", "scpl", "sbzt", "csmc", "xdgd", "azsj", "azwhdw", "gdfs", "bz", "yskzjbz", "sjtbzt", "tbsj", "lb") VALUES ('6582D67A6952057ECD132CD116F00002', '1723898292318212097', 'PS04', '绿水卫士智能液位监测仪', NULL, 'PS0401', '10', '10', 2, NULL, NULL, NULL, NULL, NULL, NULL, 'JCSB014', 'I', '2023-12-20 19:56:42.346', 2);
