INSERT INTO "jcss_rqgd" ("id", "jcss_id", "dmgc", "fsw", "szdl", "jsdm", "xzj", "js", "jgxz", "jgcz", "jgzj", "jgc", "jgk", "jxjcz", "jbs", "jszj", "qsdw", "remark", "defined", "deleted", "created_at", "created_by", "updated_at", "updated_by") VALUES ('1169637487178416128', '1169600102931628032', '1.000', '22', '3', '4', '5.000', NULL, '1', '', NULL, NULL, NULL, '0', NULL, NULL, '6', '', 0, 1, '2023-11-02 14:01:47.757', 'admin', '2023-11-02 14:02:14.142', 'admin');
INSERT INTO "jcss_rqgd" ("id", "jcss_id", "dmgc", "fsw", "szdl", "jsdm", "xzj", "js", "jgxz", "jgcz", "jgzj", "jgc", "jgk", "jxjcz", "jbs", "jszj", "qsdw", "remark", "defined", "deleted", "created_at", "created_by", "updated_at", "updated_by") VALUES ('1171511811573284864', '1171510421052456960', '5.000', '天然气管道', '无锡市滨湖区隐秀路五湖大道交汇(隐秀路)', '001', '30.000', '50.00', '0', '铁质', '2.00', '5.00', '5.00', '0', '8.00', '8.00', '华润燃气', '', 0, 1, '2023-11-07 18:09:41.517', 'admin', NULL, NULL);
