INSERT INTO "industry_supervision_patrol_plan" ("id", "scene", "type", "frequency_type", "planned_frequency", "planned_count", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "area") VALUES ('1168653673341911040', '0', '巡查养护类型12323', '1', 4, 160, NULL, '2023-10-30 20:52:28.26', '1', '2023-10-30 22:31:36.49', '1', 0, NULL);
INSERT INTO "industry_supervision_patrol_plan" ("id", "scene", "type", "frequency_type", "planned_frequency", "planned_count", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "area") VALUES ('1171035675487633408', '0', '测试', '1', 1, 192, NULL, '2023-11-06 10:37:41.827', '1', '2023-11-07 16:39:51.012', '1', 0, NULL);
INSERT INTO "industry_supervision_patrol_plan" ("id", "scene", "type", "frequency_type", "planned_frequency", "planned_count", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "area") VALUES ('1171799374028603392', '4', NULL, '1', 2, 0, NULL, '2023-11-08 13:12:21.748', '1', '2023-11-08 13:13:41.753', '1', 0, NULL);
INSERT INTO "industry_supervision_patrol_plan" ("id", "scene", "type", "frequency_type", "planned_frequency", "planned_count", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "area") VALUES ('1173383493510496256', '1', '2222', '1', 2, 2, NULL, '2023-11-12 22:07:05.264', '1', '2023-11-12 22:07:15.137', '1', 0, NULL);
INSERT INTO "industry_supervision_patrol_plan" ("id", "scene", "type", "frequency_type", "planned_frequency", "planned_count", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "area") VALUES ('1171077203572555776', '5', '这是一个测试类型', '1', 3, 300, NULL, '2023-11-06 13:22:42.894', '1', '2024-01-30 08:31:43.729', '1', 0, NULL);
INSERT INTO "industry_supervision_patrol_plan" ("id", "scene", "type", "frequency_type", "planned_frequency", "planned_count", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "area") VALUES ('1173656409695322112', '0', '养护保护', '1', 2, 2, NULL, '2023-11-13 16:11:33.553', '1', '2024-01-30 08:32:40.029', '1', 0, NULL);
INSERT INTO "industry_supervision_patrol_plan" ("id", "scene", "type", "frequency_type", "planned_frequency", "planned_count", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "area") VALUES ('1172639856631742464', '0', '特殊检查', '1', 3, 3, NULL, '2023-11-10 20:52:08.416', '1', '2024-01-30 08:32:41.769', '1', 0, NULL);
INSERT INTO "industry_supervision_patrol_plan" ("id", "scene", "type", "frequency_type", "planned_frequency", "planned_count", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "area") VALUES ('1172639781398511616', '0', '专项检查', '1', 3, 72, NULL, '2023-11-10 20:51:50.479', '1', '2024-01-30 08:32:43.396', '1', 0, NULL);
INSERT INTO "industry_supervision_patrol_plan" ("id", "scene", "type", "frequency_type", "planned_frequency", "planned_count", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "area") VALUES ('1172639699051741184', '0', '定期检查', '1', 15, 180, NULL, '2023-11-10 20:51:30.846', '1', '2024-01-30 08:32:45.468', '1', 0, NULL);
INSERT INTO "industry_supervision_patrol_plan" ("id", "scene", "type", "frequency_type", "planned_frequency", "planned_count", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "area") VALUES ('1172639557087133696', '0', '日常巡查', '1', 12, 12, NULL, '2023-11-10 20:50:56.999', '1', '2024-01-30 08:32:47.463', '1', 0, NULL);
INSERT INTO "industry_supervision_patrol_plan" ("id", "scene", "type", "frequency_type", "planned_frequency", "planned_count", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "area") VALUES ('1171800300923650048', '2', '供水巡查检查', '1', 2, 4, NULL, '2023-11-08 13:16:02.737', '1', '2024-01-30 08:32:49.553', '1', 0, NULL);
INSERT INTO "industry_supervision_patrol_plan" ("id", "scene", "type", "frequency_type", "planned_frequency", "planned_count", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "area") VALUES ('1171489028944429056', '0', '设备养护', '1', 2, 2, NULL, '2023-11-07 16:39:09.714', '1', '2024-01-30 08:32:51.144', '1', 0, NULL);
INSERT INTO "industry_supervision_patrol_plan" ("id", "scene", "type", "frequency_type", "planned_frequency", "planned_count", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "area") VALUES ('1168665479103905792', '2', '巡查养护树木', '1', 3, 3, NULL, '2023-10-30 21:39:22.973', '1', '2024-01-30 08:32:52.97', '1', 0, NULL);
INSERT INTO "industry_supervision_patrol_plan" ("id", "scene", "type", "frequency_type", "planned_frequency", "planned_count", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "area") VALUES ('1168656070147571712', '2', '养护123', '1', 2, 3, NULL, '2023-10-30 21:01:59.703', '1', '2024-01-30 08:32:57.628', '1', 0, NULL);
