INSERT INTO "archives_pitfall" ("id", "scene", "name", "type", "level", "keyword", "annex", "create_time", "create_user", "update_time", "update_user", "del_flag", "is_often", "area", "dispose_progress", "hidden_trouble_description") VALUES ('1168814102173188096', '1', '2', '1', '1', '2', '{"name":"未命名2.pdf","data":{"msg":"http://47.113.226.116:9000/wx-zhjg-work/wx-zhjg-work_1698708592575.pdf","code":1,"name":"wx-zhjg-work_1698708592575.pdf"}}', '2023-10-31 07:29:57.477', '1', '2023-11-07 16:45:36.458', '1', 0, '否', '320211', '', '燃气管道压力隐患');
INSERT INTO "archives_pitfall" ("id", "scene", "name", "type", "level", "keyword", "annex", "create_time", "create_user", "update_time", "update_user", "del_flag", "is_often", "area", "dispose_progress", "hidden_trouble_description") VALUES ('1168809896552955904', '1', '1', '0', '0', '1232', '{"name":"未命名2.pdf","data":{"msg":"http://47.113.226.116:9000/wx-zhjg-work/wx-zhjg-work_1698707591411.pdf","code":1,"name":"wx-zhjg-work_1698707591411.pdf"}}', '2023-10-31 07:13:14.778', '1', '2023-11-07 16:36:32.156', '1', 0, '是', '320211', NULL, '燃气管道压力隐患');
INSERT INTO "archives_pitfall" ("id", "scene", "name", "type", "level", "keyword", "annex", "create_time", "create_user", "update_time", "update_user", "del_flag", "is_often", "area", "dispose_progress", "hidden_trouble_description") VALUES ('1171486775323918336', '0', '122', '0', '2', '测试', '{"name":"测试上传文件.docx","data":{"msg":"http://47.113.226.116:9000/wx-zhjg-work/wx-zhjg-work_1699345806713.docx","code":1,"name":"wx-zhjg-work_1699345806713.docx"}}', '2023-11-07 16:30:12.409', '1', '2023-11-07 16:45:38.682', '1', 0, '是', '320211', '', '燃气管道压力隐患');
INSERT INTO "archives_pitfall" ("id", "scene", "name", "type", "level", "keyword", "annex", "create_time", "create_user", "update_time", "update_user", "del_flag", "is_often", "area", "dispose_progress", "hidden_trouble_description") VALUES ('1173651834590461952', '0', '1', '0', '1', '测试', '{"name":"测试上传文件.docx","data":{"msg":"http://47.113.226.116:9000/wx-zhjg-work/wx-zhjg-work_1699861998034.docx","code":1,"name":"wx-zhjg-work_1699861998034.docx"}}', '2023-11-13 15:53:22.763', '1', '2023-11-13 15:53:46.551', '1', 0, '', '320206', '', '');
INSERT INTO "archives_pitfall" ("id", "scene", "name", "type", "level", "keyword", "annex", "create_time", "create_user", "update_time", "update_user", "del_flag", "is_often", "area", "dispose_progress", "hidden_trouble_description") VALUES ('1173652564525187072', '0', '1', '1', '1', '测试', '{"name":"测试上传文件.docx","data":{"msg":"http://47.113.226.116:9000/wx-zhjg-work/wx-zhjg-work_1699862078845.docx","code":1,"name":"wx-zhjg-work_1699862078845.docx"}}', '2023-11-13 15:56:16.793', '1', '2023-11-13 15:56:25.642', '1', 0, NULL, '320206', NULL, NULL);
INSERT INTO "archives_pitfall" ("id", "scene", "name", "type", "level", "keyword", "annex", "create_time", "create_user", "update_time", "update_user", "del_flag", "is_often", "area", "dispose_progress", "hidden_trouble_description") VALUES ('1171542541305118720', '0', '观山路1号管道压力过大', '1', '3', '压力', '{"name":"2023090116361675799353.jpg","data":{"msg":"http://47.113.226.116:9000/wx-zhjg-work/wx-zhjg-work_1699359104961.jpg","code":1,"name":"wx-zhjg-work_1699359104961.jpg"}}', '2023-11-07 20:11:48.055', '1', '2023-12-21 12:57:52.463', '1', 0, '是', '320211', '', '燃气管道压力隐患');
INSERT INTO "archives_pitfall" ("id", "scene", "name", "type", "level", "keyword", "annex", "create_time", "create_user", "update_time", "update_user", "del_flag", "is_often", "area", "dispose_progress", "hidden_trouble_description") VALUES ('1171490455695654912', '4', '地下管线缺少维护', '5', '2', '腐蚀，线管', '{"name":"地下管线.docx","data":{"msg":"http://47.113.226.116:9000/wx-zhjg-work/wx-zhjg-work_1699346686957.docx","code":1,"name":"wx-zhjg-work_1699346686957.docx"}}', '2023-11-07 16:44:49.878', '1', '2023-12-21 12:57:55.261', '1', 0, '是', '320211', NULL, '燃气管道压力隐患');
