CREATE TABLE `oa_pro_task_hour_view` (
                                         `id` varchar(100) NOT NULL COMMENT '主键',
                                         `created_by` varchar(100) DEFAULT NULL COMMENT '创建人',
                                         `created_at` datetime DEFAULT NULL COMMENT '创建时间',
                                         `updated_by` varchar(100) DEFAULT NULL COMMENT '更新人',
                                         `updated_at` datetime DEFAULT NULL COMMENT '更新时间',
                                         `group_id` varchar(100) DEFAULT NULL COMMENT '集团id',
                                         `pro_id` varchar(50) DEFAULT NULL COMMENT '项目id',
                                         `pro_name` varchar(255) DEFAULT NULL COMMENT '项目名称',
                                         `create_user_name` varchar(50) DEFAULT NULL COMMENT '创建人',
                                         `users_id` text COMMENT '指定用户ids',
                                         `users_name` text COMMENT '指定用户姓名',
                                         PRIMARY KEY (`id`) USING BTREE
) ENGINE=InnoDB DEFAULT CHARSET=utf8 ROW_FORMAT=DYNAMIC COMMENT='任务工时用户指定查询表';

alter table flow_main_log add sign_file_id varchar(50) DEFAULT NULL COMMENT '小程序签名文件id';