/*
 Navicat Premium Data Transfer

 Source Server         : 0测试数据库_47.113.226.116
 Source Server Type    : MySQL
 Source Server Version : 50744
 Source Host           : 47.113.226.116:3306
 Source Schema         : idea_fire_safety_hd

 Target Server Type    : MySQL
 Target Server Version : 50744
 File Encoding         : 65001

 Date: 11/03/2025 17:37:13
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for company_fire_facilities
-- ----------------------------
DROP TABLE IF EXISTS `company_fire_facilities`;
CREATE TABLE `company_fire_facilities`  (
  `id` varchar(64) CHARACTER SET utf8 COLLATE utf8_general_ci NOT NULL COMMENT '主键',
  `company_id` varchar(64) CHARACTER SET utf8 COLLATE utf8_general_ci NULL DEFAULT NULL COMMENT '主题id',
  `fire_type` varchar(64) CHARACTER SET utf8 COLLATE utf8_general_ci NULL DEFAULT NULL COMMENT '消防设施类型',
  `fire_value` text CHARACTER SET utf8 COLLATE utf8_general_ci NULL COMMENT '消防设施各个指标json存放',
  `created_by` varchar(64) CHARACTER SET utf8 COLLATE utf8_general_ci NULL DEFAULT NULL COMMENT '创建id',
  `created_at` datetime NULL DEFAULT NULL COMMENT '创建时间',
  `updated_by` varchar(64) CHARACTER SET utf8 COLLATE utf8_general_ci NULL DEFAULT NULL COMMENT '更新id',
  `updated_at` datetime NULL DEFAULT NULL COMMENT '更新时间',
  `my_remark` varchar(255) CHARACTER SET utf8 COLLATE utf8_general_ci NULL DEFAULT NULL COMMENT '备注',
  `my_status` tinyint(1) NULL DEFAULT NULL COMMENT '状态0正常1删除',
  `credit_code` varchar(255) CHARACTER SET utf8 COLLATE utf8_general_ci NULL DEFAULT NULL COMMENT '统一信用代码',
  PRIMARY KEY (`id`) USING BTREE
) ENGINE = InnoDB CHARACTER SET = utf8 COLLATE = utf8_general_ci COMMENT = '市场主体添加消防' ROW_FORMAT = Dynamic;

-- ----------------------------
-- Records of company_fire_facilities
-- ----------------------------
INSERT INTO `company_fire_facilities` VALUES ('12b61fbefe5911efaade0242ac110007', '1', '1', '{\"消控室电话\":\"-\",\"气压罐容量（m³）\":\"-\",\"气压罐个数\":\"-\",\"消防水池容量（m³）\":\"-\",\"消防水池位置\":\"-\",\"消防水箱容量（m³）\":\"-\",\"消防水箱位置\":\"-\",\"灭火器数量（个）\":\"36\",\"消火栓数量（个）\":\"7\",\"烟雾感应报警器（个）\":\"-\",\"一键报警广播（个）\":\"-\",\"自动喷水灭火系统喷头（个）\":\"-\"}', NULL, NULL, NULL, NULL, NULL, NULL, '913202111361463326');
INSERT INTO `company_fire_facilities` VALUES ('12b622defe5911efaade0242ac110007', '10', '1', '{\"消控室电话\":\"-\",\"气压罐容量（m³）\":\"1\",\"气压罐个数\":\"-\",\"消防水池容量（m³）\":\"500\",\"消防水池位置\":\"车间北面\",\"消防水箱容量（m³）\":\"10\",\"消防水箱位置\":\"办公大楼楼顶\",\"灭火器数量（个）\":\"102\",\"消火栓数量（个）\":\"39\",\"烟雾感应报警器（个）\":\"-\",\"一键报警广播（个）\":\"-\",\"自动喷水灭火系统喷头（个）\":\"-\"}', NULL, NULL, NULL, NULL, NULL, NULL, '913202117673817771');
INSERT INTO `company_fire_facilities` VALUES ('12b62389fe5911efaade0242ac110007', '11', '1', '{\"消控室电话\":\"-\",\"气压罐容量（m³）\":\"-\",\"气压罐个数\":\"-\",\"消防水池容量（m³）\":\"-\",\"消防水池位置\":\"-\",\"消防水箱容量（m³）\":\"-\",\"消防水箱位置\":\"-\",\"灭火器数量（个）\":\"30\",\"消火栓数量（个）\":\"-\",\"烟雾感应报警器（个）\":\"-\",\"一键报警广播（个）\":\"-\",\"自动喷水灭火系统喷头（个）\":\"-\"}', NULL, NULL, NULL, NULL, NULL, NULL, '91320211607954871A');
INSERT INTO `company_fire_facilities` VALUES ('12b62406fe5911efaade0242ac110007', '12', '1', '{\"消控室电话\":\"-\",\"气压罐容量（m³）\":\"1\",\"气压罐个数\":\"-\",\"消防水池容量（m³）\":\"800\",\"消防水池位置\":\"办公楼（1号楼）地下\",\"消防水箱容量（m³）\":\"12\",\"消防水箱位置\":\"车间楼顶（2号楼）\",\"灭火器数量（个）\":\"150\",\"消火栓数量（个）\":\"6\",\"烟雾感应报警器（个）\":\"-\",\"一键报警广播（个）\":\"-\",\"自动喷水灭火系统喷头（个）\":\"-\"}', NULL, NULL, NULL, NULL, NULL, NULL, '91320200MA1MQGR73M');
INSERT INTO `company_fire_facilities` VALUES ('12b6246efe5911efaade0242ac110007', '13', '1', '{\"消控室电话\":\"-\",\"气压罐容量（m³）\":\"2\",\"气压罐个数\":\"-\",\"消防水池容量（m³）\":\"160\",\"消防水池位置\":\"消防泵房旁边\",\"消防水箱容量（m³）\":\"8\",\"消防水箱位置\":\"楼顶\",\"灭火器数量（个）\":\"85\",\"消火栓数量（个）\":\"60\",\"烟雾感应报警器（个）\":\"-\",\"一键报警广播（个）\":\"-\",\"自动喷水灭火系统喷头（个）\":\"-\"}', NULL, NULL, NULL, NULL, NULL, NULL, '913202117322436571');
INSERT INTO `company_fire_facilities` VALUES ('12b624c6fe5911efaade0242ac110007', '14', '1', '{\"消控室电话\":\"-\",\"气压罐容量（m³）\":\"1\",\"气压罐个数\":\"2\",\"消防水池容量（m³）\":\"-\",\"消防水池位置\":\"-\",\"消防水箱容量（m³）\":\"-\",\"消防水箱位置\":\"-\",\"灭火器数量（个）\":\"36\",\"消火栓数量（个）\":\"3\",\"烟雾感应报警器（个）\":\"-\",\"一键报警广播（个）\":\"-\",\"自动喷水灭火系统喷头（个）\":\"-\"}', NULL, NULL, NULL, NULL, NULL, NULL, '91320211MA1P7X4Y3K');
INSERT INTO `company_fire_facilities` VALUES ('12b62519fe5911efaade0242ac110007', '15', '1', '{\"消控室电话\":\"-\",\"气压罐容量（m³）\":\"-\",\"气压罐个数\":\"-\",\"消防水池容量（m³）\":\"-\",\"消防水池位置\":\"-\",\"消防水箱容量（m³）\":\"-\",\"消防水箱位置\":\"-\",\"灭火器数量（个）\":\"15\",\"消火栓数量（个）\":\"-\",\"烟雾感应报警器（个）\":\"-\",\"一键报警广播（个）\":\"-\",\"自动喷水灭火系统喷头（个）\":\"-\"}', NULL, NULL, NULL, NULL, NULL, NULL, '913202117746540593');
INSERT INTO `company_fire_facilities` VALUES ('12b62568fe5911efaade0242ac110007', '16', '1', '{\"消控室电话\":\"-\",\"气压罐容量（m³）\":\"-\",\"气压罐个数\":\"-\",\"消防水池容量（m³）\":\"-\",\"消防水池位置\":\"-\",\"消防水箱容量（m³）\":\"-\",\"消防水箱位置\":\"-\",\"灭火器数量（个）\":\"62\",\"消火栓数量（个）\":\"1\",\"烟雾感应报警器（个）\":\"-\",\"一键报警广播（个）\":\"-\",\"自动喷水灭火系统喷头（个）\":\"-\"}', NULL, NULL, NULL, NULL, NULL, NULL, '91320211765891183U');
INSERT INTO `company_fire_facilities` VALUES ('12b625b8fe5911efaade0242ac110007', '17', '1', '{\"消控室电话\":\"-\",\"气压罐容量（m³）\":\"-\",\"气压罐个数\":\"-\",\"消防水池容量（m³）\":\"-\",\"消防水池位置\":\"-\",\"消防水箱容量（m³）\":\"-\",\"消防水箱位置\":\"-\",\"灭火器数量（个）\":\"98\",\"消火栓数量（个）\":\"2\",\"烟雾感应报警器（个）\":\"-\",\"一键报警广播（个）\":\"-\",\"自动喷水灭火系统喷头（个）\":\"-\"}', NULL, NULL, NULL, NULL, NULL, NULL, '91320211748189579J');
INSERT INTO `company_fire_facilities` VALUES ('12b6260efe5911efaade0242ac110007', '2', '1', '{\"消控室电话\":\"-\",\"气压罐容量（m³）\":\"-\",\"气压罐个数\":\"-\",\"消防水池容量（m³）\":\"100\",\"消防水池位置\":\"工业园8号大门口\",\"消防水箱容量（m³）\":\"40\",\"消防水箱位置\":\"2号楼顶\",\"灭火器数量（个）\":\"80\",\"消火栓数量（个）\":\"35\",\"烟雾感应报警器（个）\":\"1\",\"一键报警广播（个）\":\"-\",\"自动喷水灭火系统喷头（个）\":\"10\"}', NULL, NULL, NULL, NULL, NULL, NULL, '91320211588430027C');
INSERT INTO `company_fire_facilities` VALUES ('12b62669fe5911efaade0242ac110007', '3', '1', '{\"消控室电话\":\"-\",\"气压罐容量（m³）\":\"-\",\"气压罐个数\":\"-\",\"消防水池容量（m³）\":\"500\",\"消防水池位置\":\"厂区西北角\",\"消防水箱容量（m³）\":\"18\",\"消防水箱位置\":\"厂房楼顶\",\"灭火器数量（个）\":\"98\",\"消火栓数量（个）\":\"33\",\"烟雾感应报警器（个）\":\"-\",\"一键报警广播（个）\":\"-\",\"自动喷水灭火系统喷头（个）\":\"2\"}', NULL, NULL, NULL, NULL, NULL, NULL, '91320211136248646M');
INSERT INTO `company_fire_facilities` VALUES ('12b626bafe5911efaade0242ac110007', '4', '1', '{\"消控室电话\":\"-\",\"气压罐容量（m³）\":\"-\",\"气压罐个数\":\"-\",\"消防水池容量（m³）\":\"300\",\"消防水池位置\":\"办公楼东侧地下一层\",\"消防水箱容量（m³）\":\"18\",\"消防水箱位置\":\"楼顶\",\"灭火器数量（个）\":\"176\",\"消火栓数量（个）\":\"99\",\"烟雾感应报警器（个）\":\"300\",\"一键报警广播（个）\":\"4\",\"自动喷水灭火系统喷头（个）\":\"3\"}', NULL, NULL, NULL, NULL, NULL, NULL, '91320211583752801U');
INSERT INTO `company_fire_facilities` VALUES ('12b6270ffe5911efaade0242ac110007', '5', '1', '{\"消控室电话\":\"-\",\"气压罐容量（m³）\":\"-\",\"气压罐个数\":\"-\",\"消防水池容量（m³）\":\"-\",\"消防水池位置\":\"-\",\"消防水箱容量（m³）\":\"-\",\"消防水箱位置\":\"-\",\"灭火器数量（个）\":\"35\",\"消火栓数量（个）\":\"45\",\"烟雾感应报警器（个）\":\"-\",\"一键报警广播（个）\":\"1\",\"自动喷水灭火系统喷头（个）\":\"-\"}', NULL, NULL, NULL, NULL, NULL, NULL, '91320211301944347E');
INSERT INTO `company_fire_facilities` VALUES ('12b6275ffe5911efaade0242ac110007', '6', '1', '{\"消控室电话\":\"-\",\"气压罐容量（m³）\":\"3\",\"气压罐个数\":\"-\",\"消防水池容量（m³）\":\"18\",\"消防水池位置\":\"1#楼顶\",\"消防水箱容量（m³）\":\"18\",\"消防水箱位置\":\"1#楼顶\",\"灭火器数量（个）\":\"150\",\"消火栓数量（个）\":\"60\",\"烟雾感应报警器（个）\":\"1500\",\"一键报警广播（个）\":\"30\",\"自动喷水灭火系统喷头（个）\":\"1500\"}', NULL, NULL, NULL, NULL, NULL, NULL, '91320211730714179D');
INSERT INTO `company_fire_facilities` VALUES ('12b627b2fe5911efaade0242ac110007', '7', '1', '{\"消控室电话\":\"-\",\"气压罐容量（m³）\":\"600L\",\"气压罐个数\":\"-\",\"消防水池容量（m³）\":\"200\",\"消防水池位置\":\"保安室 负一楼\",\"消防水箱容量（m³）\":\"18\",\"消防水箱位置\":\"办公大楼 楼顶\",\"灭火器数量（个）\":\"200\",\"消火栓数量（个）\":\"90\",\"烟雾感应报警器（个）\":\"-\",\"一键报警广播（个）\":\"-\",\"自动喷水灭火系统喷头（个）\":\"-\"}', NULL, NULL, NULL, NULL, NULL, NULL, '91320211769137321E');
INSERT INTO `company_fire_facilities` VALUES ('12b62804fe5911efaade0242ac110007', '8', '1', '{\"消控室电话\":\"-\",\"气压罐容量（m³）\":\"1\",\"气压罐个数\":\"-\",\"消防水池容量（m³）\":\"500\",\"消防水池位置\":\"门卫室西面地下\",\"消防水箱容量（m³）\":\"18\",\"消防水箱位置\":\"厂房屋顶\",\"灭火器数量（个）\":\"120\",\"消火栓数量（个）\":\"40\",\"烟雾感应报警器（个）\":\"-\",\"一键报警广播（个）\":\"-\",\"自动喷水灭火系统喷头（个）\":\"-\"}', NULL, NULL, NULL, NULL, NULL, NULL, '91320211607952753A');
INSERT INTO `company_fire_facilities` VALUES ('12b62854fe5911efaade0242ac110007', '9', '1', '{\"消控室电话\":\"-\",\"气压罐容量（m³）\":\"-\",\"气压罐个数\":\"-\",\"消防水池容量（m³）\":\"172\",\"消防水池位置\":\"1号锻造车间\",\"消防水箱容量（m³）\":\"-\",\"消防水箱位置\":\"-\",\"灭火器数量（个）\":\"240\",\"消火栓数量（个）\":\"10\",\"烟雾感应报警器（个）\":\"-\",\"一键报警广播（个）\":\"-\",\"自动喷水灭火系统喷头（个）\":\"-\"}', NULL, NULL, NULL, NULL, NULL, NULL, '913202112500560589');
INSERT INTO `company_fire_facilities` VALUES ('12b628b0fe5911efaade0242ac110007', '18', '1', '{\"消控室电话\":\"-\",\"气压罐容量（m³）\":\"-\",\"气压罐个数\":\"-\",\"消防水池容量（m³）\":\"300\",\"消防水池位置\":\"餐厅楼下\",\"消防水箱容量（m³）\":\"30\",\"消防水箱位置\":\"厂房顶\",\"灭火器数量（个）\":\"78\",\"消火栓数量（个）\":\"35\",\"烟雾感应报警器（个）\":\"-\",\"一键报警广播（个）\":\"-\",\"自动喷水灭火系统喷头（个）\":\"-\"}', NULL, NULL, NULL, NULL, NULL, NULL, '91320200661795074');

SET FOREIGN_KEY_CHECKS = 1;
