INSERT INTO "industry_supervision_plan" ("id", "type", "unit", "name", "content", "level", "completion_time", "scene", "label", "annex", "release_time", "state", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "cb") VALUES ('9de398651aba1e965fb83ae5132f420e', '新建', NULL, '无锡锡山区金科涂装工业外围芙蓉一路（团结中路-新徐路）中压燃气工程', '团结中路-新徐路', NULL, NULL, '0', NULL, NULL, NULL, '0', NULL, '2024-03-05 09:03:25.38', 'bigdata', NULL, NULL, 1, NULL);
INSERT INTO "industry_supervision_plan" ("id", "type", "unit", "name", "content", "level", "completion_time", "scene", "label", "annex", "release_time", "state", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "cb") VALUES ('f25b92b7bf821cc672b55084777d4a2a', '新建', NULL, '4无锡市G312国道（苏巷路-惠山大道）中压燃气工程', '苏巷路-惠山大道', NULL, NULL, '0', NULL, NULL, NULL, '0', NULL, '2024-03-05 09:03:25.38', 'bigdata', NULL, NULL, 1, NULL);
INSERT INTO "industry_supervision_plan" ("id", "type", "unit", "name", "content", "level", "completion_time", "scene", "label", "annex", "release_time", "state", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "cb") VALUES ('0f680c7da9588f75887de78a8b86d110', '新建', NULL, '无锡锡山区锡港路（圣隆五金）外围中压燃气工程', '公福', NULL, NULL, '0', NULL, NULL, NULL, '0', NULL, '2024-03-05 09:03:25.38', 'bigdata', NULL, NULL, 1, NULL);
INSERT INTO "industry_supervision_plan" ("id", "type", "unit", "name", "content", "level", "completion_time", "scene", "label", "annex", "release_time", "state", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "cb") VALUES ('7ec1665a30ce08b67127d183ae1f004c', '新建', NULL, '无锡锡山区陈戴路（勤新路-河东庄）中压燃气工程', '勤新路-河东庄', NULL, NULL, '0', NULL, NULL, NULL, '0', NULL, '2024-03-05 09:03:25.38', 'bigdata', NULL, NULL, 1, NULL);
INSERT INTO "industry_supervision_plan" ("id", "type", "unit", "name", "content", "level", "completion_time", "scene", "label", "annex", "release_time", "state", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "cb") VALUES ('b60132c78a49b766092a437d68da9182', '新建', NULL, '无锡高浪路快速化改造二期（菱湖大道~长江南路）中压燃气改造工程（夏）', '菱湖大道~长江南路', NULL, NULL, '0', NULL, NULL, NULL, '0', NULL, '2024-03-05 09:03:25.38', 'bigdata', NULL, NULL, 1, NULL);
INSERT INTO "industry_supervision_plan" ("id", "type", "unit", "name", "content", "level", "completion_time", "scene", "label", "annex", "release_time", "state", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "cb") VALUES ('5a363e91ded271b85109762cb0ec4f3d', '新建', NULL, '无锡锡山区红掌柜有限责任公司外围配套中压燃气工程', '公福', NULL, NULL, '0', NULL, NULL, NULL, '0', NULL, '2024-03-05 09:03:25.38', 'bigdata', NULL, NULL, 1, NULL);
INSERT INTO "industry_supervision_plan" ("id", "type", "unit", "name", "content", "level", "completion_time", "scene", "label", "annex", "release_time", "state", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "cb") VALUES ('2404bca824973976c6866b1f3d689474', '新建', NULL, '无锡市惠山区曙光南路（前进路～孙梅河）市政中压燃气工程', '前进路～孙梅河', NULL, NULL, '0', NULL, NULL, NULL, '0', NULL, '2024-03-05 09:03:25.38', 'bigdata', NULL, NULL, 1, NULL);
INSERT INTO "industry_supervision_plan" ("id", "type", "unit", "name", "content", "level", "completion_time", "scene", "label", "annex", "release_time", "state", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "cb") VALUES ('75e3e8ea43d051a87597c3c859dee265', '新建', NULL, '无锡惠山区祁祥路（中铁建）外围中压燃气工程', '锡西大道-常玉路', NULL, NULL, '0', NULL, NULL, NULL, '0', NULL, '2024-03-05 09:03:25.38', 'bigdata', NULL, NULL, 1, NULL);
INSERT INTO "industry_supervision_plan" ("id", "type", "unit", "name", "content", "level", "completion_time", "scene", "label", "annex", "release_time", "state", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "cb") VALUES ('20d22ea9b39ab1c9c88b4f8f64d14720', '新建', NULL, '无锡惠山区山浜路（堰桥南路-凤翔路）中压燃气工程 ', '堰桥南路-凤翔路', NULL, NULL, '0', NULL, NULL, NULL, '0', NULL, '2024-03-05 09:03:25.38', 'bigdata', NULL, NULL, 1, NULL);
INSERT INTO "industry_supervision_plan" ("id", "type", "unit", "name", "content", "level", "completion_time", "scene", "label", "annex", "release_time", "state", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "cb") VALUES ('5c636c45a99edeaaaea5638ae648f2d0', '新建', NULL, '和风路', '和风路', NULL, NULL, '0', NULL, NULL, NULL, '0', NULL, '2024-03-05 09:03:25.38', 'bigdata', NULL, NULL, 1, NULL);
INSERT INTO "industry_supervision_plan" ("id", "type", "unit", "name", "content", "level", "completion_time", "scene", "label", "annex", "release_time", "state", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "cb") VALUES ('0448c0b6e5cacd37b171e5563a17e39b', '新建', NULL, '无锡惠山区瑞祁路(祁北路-芬凯人造草坪科技有限公司)中压燃气工程', '祁北路-芬凯人造草坪科技有限公司', NULL, NULL, '0', NULL, NULL, NULL, '0', NULL, '2024-03-05 09:03:25.38', 'bigdata', NULL, NULL, 1, NULL);
INSERT INTO "industry_supervision_plan" ("id", "type", "unit", "name", "content", "level", "completion_time", "scene", "label", "annex", "release_time", "state", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "cb") VALUES ('5ca2de64a4b13d8e078fd92aad624bc5', '新建', NULL, '无锡黄山路（珠江路~汉江路）中压燃气改造工程', '珠江路~汉江路', NULL, NULL, '0', NULL, NULL, NULL, '0', NULL, '2024-03-05 09:03:25.38', 'bigdata', NULL, NULL, 1, NULL);
INSERT INTO "industry_supervision_plan" ("id", "type", "unit", "name", "content", "level", "completion_time", "scene", "label", "annex", "release_time", "state", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "cb") VALUES ('7766e21f48ce8bfc3f56ebfea1fd5e38', '新建', NULL, '无锡锡山区茶新路(翠竹路-太湖翠竹外围)中压燃气工程', '翠竹路-太湖翠竹外围', NULL, NULL, '0', NULL, NULL, NULL, '0', NULL, '2024-03-05 09:03:25.38', 'bigdata', NULL, NULL, 1, NULL);
INSERT INTO "industry_supervision_plan" ("id", "type", "unit", "name", "content", "level", "completion_time", "scene", "label", "annex", "release_time", "state", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "cb") VALUES ('b636ecc3724199cc63dfbf712058c9a3', '新建', NULL, '无锡梁溪区蓉湖路（锡山南路-五爱路）中压燃气改造工程', '锡山南路-五爱路', NULL, NULL, '0', NULL, NULL, NULL, '0', NULL, '2024-03-05 09:03:25.38', 'bigdata', NULL, NULL, 1, NULL);
INSERT INTO "industry_supervision_plan" ("id", "type", "unit", "name", "content", "level", "completion_time", "scene", "label", "annex", "release_time", "state", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "cb") VALUES ('a5465db4c8729d36e12bb7c63aba599f', '新建', NULL, '无锡滨湖区瑞云路（沪宜公路-西溪路）中压燃气工程', '沪宜公路-西溪路', NULL, NULL, '0', NULL, NULL, NULL, '0', NULL, '2024-03-05 09:03:25.38', 'bigdata', NULL, NULL, 1, NULL);
INSERT INTO "industry_supervision_plan" ("id", "type", "unit", "name", "content", "level", "completion_time", "scene", "label", "annex", "release_time", "state", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "cb") VALUES ('6a777e1eb31496fb2973471d42d7a007', '新建', NULL, '无锡市锡山区吉成芯半导体科技有限公司外围中压（泾阳路泾祥路）燃气工程', '公福', NULL, NULL, '0', NULL, NULL, NULL, '0', NULL, '2024-03-05 09:03:25.38', 'bigdata', NULL, NULL, 1, NULL);
INSERT INTO "industry_supervision_plan" ("id", "type", "unit", "name", "content", "level", "completion_time", "scene", "label", "annex", "release_time", "state", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "cb") VALUES ('f6887064747f0163f03e078f9bb6b0a4', '新建', NULL, '无锡锡山区勤工路', '群星路-红宇铝业', NULL, NULL, '0', NULL, NULL, NULL, '0', NULL, '2024-03-05 09:03:25.38', 'bigdata', NULL, NULL, 1, NULL);
INSERT INTO "industry_supervision_plan" ("id", "type", "unit", "name", "content", "level", "completion_time", "scene", "label", "annex", "release_time", "state", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "cb") VALUES ('040294c7ec003e658470b2412f31c21f', '新建', NULL, '无锡惠山区祁桐路', '兴亚路~文祁路', NULL, NULL, '0', NULL, NULL, NULL, '0', NULL, '2024-03-05 09:03:25.38', 'bigdata', NULL, NULL, 1, NULL);
INSERT INTO "industry_supervision_plan" ("id", "type", "unit", "name", "content", "level", "completion_time", "scene", "label", "annex", "release_time", "state", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "cb") VALUES ('0a3eff98f462f6384b75c734bae61369', '新建', NULL, '无锡梁溪区广吉路(李巷路-梁溪区锡源尚院A地块西侧规划道路)中压燃气工程', '李巷路-梁溪区锡源尚院A地块西侧规划道路', NULL, NULL, '0', NULL, NULL, NULL, '0', NULL, '2024-03-05 09:03:25.38', 'bigdata', NULL, NULL, 1, NULL);
INSERT INTO "industry_supervision_plan" ("id", "type", "unit", "name", "content", "level", "completion_time", "scene", "label", "annex", "release_time", "state", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "cb") VALUES ('a107ce9936e83bc5ff2f521ae9267003', '新建', NULL, '无锡经开区高远路（太湖湾信息产业园外围）中压燃气工程', '公福', NULL, NULL, '0', NULL, NULL, NULL, '0', NULL, '2024-03-05 09:03:25.38', 'bigdata', NULL, NULL, 1, NULL);
INSERT INTO "industry_supervision_plan" ("id", "type", "unit", "name", "content", "level", "completion_time", "scene", "label", "annex", "release_time", "state", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "cb") VALUES ('9361699bc4a30542b6e5ca85e0fe62c8', '新建', NULL, '新吴区锡贤路（新华路至梅东河）中压燃气工程', '新华路 ~梅东河', NULL, NULL, '0', NULL, NULL, NULL, '0', NULL, '2024-03-05 09:03:25.38', 'bigdata', NULL, NULL, 1, NULL);
INSERT INTO "industry_supervision_plan" ("id", "type", "unit", "name", "content", "level", "completion_time", "scene", "label", "annex", "release_time", "state", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "cb") VALUES ('f54e94ceb2e04013682b96ab92b419d5', '新建', NULL, '无锡中国人民解放军31121部队（滨湖区）外围道路中压燃气工程', '道路', NULL, NULL, '0', NULL, NULL, NULL, '0', NULL, '2024-03-05 09:03:25.38', 'bigdata', NULL, NULL, 1, NULL);
INSERT INTO "industry_supervision_plan" ("id", "type", "unit", "name", "content", "level", "completion_time", "scene", "label", "annex", "release_time", "state", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "cb") VALUES ('24d0a8f6f97bac53c71e5985cdf54de9', '新建', NULL, '无锡经开区老锡南路（方庙路-吴都路）中压燃气工程', '方庙路-吴都路', NULL, NULL, '0', NULL, NULL, NULL, '0', NULL, '2024-03-05 09:03:25.38', 'bigdata', NULL, NULL, 1, NULL);
INSERT INTO "industry_supervision_plan" ("id", "type", "unit", "name", "content", "level", "completion_time", "scene", "label", "annex", "release_time", "state", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "cb") VALUES ('f48a3f1cfb85d1546da4ce4a5cad2b26', '新建', NULL, '无锡滨湖区梁康路马盛环境能源科技有限公司外围中压燃气工程', '公福', NULL, NULL, '0', NULL, NULL, NULL, '0', NULL, '2024-03-05 09:03:25.38', 'bigdata', NULL, NULL, 1, NULL);
INSERT INTO "industry_supervision_plan" ("id", "type", "unit", "name", "content", "level", "completion_time", "scene", "label", "annex", "release_time", "state", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "cb") VALUES ('6e1b5494b4014a00e6e5c7d720a05905', '新建', NULL, '无锡惠山区玉祁消防专职队外围中压燃气工程', '公福', NULL, NULL, '0', NULL, NULL, NULL, '0', NULL, '2024-03-05 09:03:25.38', 'bigdata', NULL, NULL, 1, NULL);
INSERT INTO "industry_supervision_plan" ("id", "type", "unit", "name", "content", "level", "completion_time", "scene", "label", "annex", "release_time", "state", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "cb") VALUES ('f0e4f735c27aae6d8a2cc7cdd9d34b4e', '新建', NULL, '无锡锡山区五洋陶瓷外围石新路（农石路-五洋陶瓷）中压燃气工程', '农石路-五洋陶瓷', NULL, NULL, '0', NULL, NULL, NULL, '0', NULL, '2024-03-05 09:03:25.38', 'bigdata', NULL, NULL, 1, NULL);
INSERT INTO "industry_supervision_plan" ("id", "type", "unit", "name", "content", "level", "completion_time", "scene", "label", "annex", "release_time", "state", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "cb") VALUES ('5bb220325421d7131d1684766cacd01d', '新建', NULL, '无锡吕洋车辆配件厂外围道路（锡山区天佑路——锡沪路）燃气工程', '锡山区天佑路——锡沪路', NULL, NULL, '0', NULL, NULL, NULL, '0', NULL, '2024-03-05 09:03:25.38', 'bigdata', NULL, NULL, 1, NULL);
INSERT INTO "industry_supervision_plan" ("id", "type", "unit", "name", "content", "level", "completion_time", "scene", "label", "annex", "release_time", "state", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "cb") VALUES ('42', '养护维修', NULL, '城市桥梁安全防护设施隐患整治', '经过现场排查统计，实施栏杆安全隐患整治的总费用约750万元，2019年计划先行对栏杆高度低于0.9m的桥梁（马蠡港桥、通裕桥、通惠桥、问溪桥、溪南桥）栏杆进行更换', NULL, NULL, '5', NULL, NULL, NULL, '0', NULL, '2024-03-05 09:03:25.64', 'bigdata', NULL, NULL, 1, NULL);
INSERT INTO "industry_supervision_plan" ("id", "type", "unit", "name", "content", "level", "completion_time", "scene", "label", "annex", "release_time", "state", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "cb") VALUES ('39', '养护维修', NULL, '支座更换中修', '1、对蓉湖大桥进行梁体顶升支座更换，限位装置安装24只，支座更换7只，顶升断面共8个。                                                                                                                                       2、锡宁高架跨越通江大道及锡澄路单排出现剪切超限、位移超限和完全脱空的支座（共22排）进行单排同步顶升、单排支座全部更换；取出橡胶支座上的油毛毡，采用不锈钢板加结构胶进行调平。
3、对锡宁高架跨越通江大道及锡澄路，局部脱空的支座（11个）采取人工填塞镀锌钢板的办法进行处理。', NULL, NULL, '5', NULL, NULL, NULL, '0', NULL, '2024-03-05 09:03:25.64', 'bigdata', NULL, NULL, 1, NULL);
INSERT INTO "industry_supervision_plan" ("id", "type", "unit", "name", "content", "level", "completion_time", "scene", "label", "annex", "release_time", "state", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "cb") VALUES ('25', '养护维修', NULL, '桥梁支座更换', '对上述桥梁支座进行梁体顶升后的支座更换约330个，确保桥梁在健康状况下安全运行', NULL, NULL, '5', NULL, NULL, NULL, '0', NULL, '2024-03-05 09:03:25.64', 'bigdata', NULL, NULL, 1, NULL);
INSERT INTO "industry_supervision_plan" ("id", "type", "unit", "name", "content", "level", "completion_time", "scene", "label", "annex", "release_time", "state", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "cb") VALUES ('44', '养护维修', NULL, '市管桥梁桥门洞围档', '1、枕溪桥两侧驳岸边需设围栏（长15m+15m+20m+宽20m）*2，共计180m
两幅桥中间需设不锈钢栅栏（230㎡）
2、马蠡港桥东侧及西南侧桥下空间需设铁栅栏共计30m
3、蠡湖大桥南侧第一、二跨桥下空间需设铁栅栏(25+25+25+25+33)m，共计133m
4、金星人行天桥推坡道桥下空间需设2处铁栅栏（8+4+8）*2m，梯道下方空间需设2处铁栅栏（8+4+8）*2m，共计80m
5、金城公铁立交金城路主线东侧桥台处桥下空间需增设铁栅栏165m
6、金城公铁立交慢行系统桥台处桥下空间增设铁栅栏145m
7、机场路高架A匝道桥下空间增设铁栅栏90m
8、凤翔路高架A匝道、U4匝道桥台处桥下空间增设铁栅栏160m
9、江海路高架主线南侧桥台处桥下空间、D3匝道桥台处桥下空间增设铁栅栏130m', NULL, NULL, '5', NULL, NULL, NULL, '0', NULL, '2024-03-05 09:03:25.64', 'bigdata', NULL, NULL, 1, NULL);
INSERT INTO "industry_supervision_plan" ("id", "type", "unit", "name", "content", "level", "completion_time", "scene", "label", "annex", "release_time", "state", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "cb") VALUES ('15', '养护维修', NULL, '渔港立交桥梁梁体位移复位专项抢
修', '对该桥梁进行修复，安排渔港立交桥梁梁体移位复原', NULL, NULL, '5', NULL, NULL, NULL, '0', NULL, '2024-03-05 09:03:25.64', 'bigdata', NULL, NULL, 1, NULL);
INSERT INTO "industry_supervision_plan" ("id", "type", "unit", "name", "content", "level", "completion_time", "scene", "label", "annex", "release_time", "state", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "cb") VALUES ('11', '养护维修', NULL, '华清大桥伸缩缝维修及钢梁油漆', '拆除两条型钢双伸缩缝共70米，对钢梁整体进行除锈油漆', NULL, NULL, '5', NULL, NULL, NULL, '0', NULL, '2024-03-05 09:03:25.64', 'bigdata', NULL, NULL, 1, NULL);
INSERT INTO "industry_supervision_plan" ("id", "type", "unit", "name", "content", "level", "completion_time", "scene", "label", "annex", "release_time", "state", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "cb") VALUES ('13', '养护维修', NULL, '广南立交匝道抢修', '恢复破损匝道桥悬臂段、防撞护栏及桥面铺装，确保桥梁安全、完好，需摊铺沥青14.5㎡，浇筑C40混凝土8.72m，钢筋158KG', NULL, NULL, '5', NULL, NULL, NULL, '0', NULL, '2024-03-05 09:03:25.64', 'bigdata', NULL, NULL, 1, NULL);
INSERT INTO "industry_supervision_plan" ("id", "type", "unit", "name", "content", "level", "completion_time", "scene", "label", "annex", "release_time", "state", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "cb") VALUES ('27', '养护维修', NULL, '金城大桥、蠡踪桥维修', '1、金城大桥：裂缝宽度fw≥0.15mm的采用灌缝处理，灌浆约85m，宽度fw＜0.15mm的裂缝封闭520m，对于抗剪界面尺寸不足且抗剪强度不足的区域进行贴钢板加固，钢板加固约1130m2；右幅2-1-33#支座更换37个；桥面维修和伸缩缝维修。
2、蠡综桥铣刨沥青、凿除混凝土铺装层，裂缝封闭，重新浇筑混凝土铺装层、摊铺沥青砼。（面积630m2)', NULL, NULL, '5', NULL, NULL, NULL, '0', NULL, '2024-03-05 09:03:25.64', 'bigdata', NULL, NULL, 1, NULL);
INSERT INTO "industry_supervision_plan" ("id", "type", "unit", "name", "content", "level", "completion_time", "scene", "label", "annex", "release_time", "state", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "cb") VALUES ('38', '养护维修', NULL, '惠农桥中修', '对第3跨1#T梁和第3跨17#T梁病害部位出现的破损露筋或钢筋锈胀情况，凿除松散混凝土，先除锈后进行环氧砂浆修补，并采取整体防锈处置措施。同时对兴源北路惠农桥处出水口进行改造。 ', NULL, NULL, '5', NULL, NULL, NULL, '0', NULL, '2024-03-05 09:03:25.64', 'bigdata', NULL, NULL, 1, NULL);
INSERT INTO "industry_supervision_plan" ("id", "type", "unit", "name", "content", "level", "completion_time", "scene", "label", "annex", "release_time", "state", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "cb") VALUES ('23', '养护维修', NULL, '桥门洞围护', '建议分别将青祁高架、吴桥、山北大桥等部分桥梁的桥门洞设置围栏（围护长度约2000m）。', NULL, NULL, '5', NULL, NULL, NULL, '0', NULL, '2024-03-05 09:03:25.64', 'bigdata', NULL, NULL, 1, NULL);
INSERT INTO "industry_supervision_plan" ("id", "type", "unit", "name", "content", "level", "completion_time", "scene", "label", "annex", "release_time", "state", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "cb") VALUES ('24', '养护维修', NULL, '桥梁伸缩缝维修', '由于梳齿形伸缩缝存在实际使用问题，全国各地都在更换此类伸缩缝。建议：对以上部分高架桥和大桥（损坏最严重的瞻江立交通江大道主线及EN匝道、金城公铁立交兴源路主线2条伸缩缝及蓉湖大桥伸缩缝先进行更换改造）部分梳齿形伸缩缝进行改造，改造形式为型钢伸缩缝（约400m）。
', NULL, NULL, '5', NULL, NULL, NULL, '0', NULL, '2024-03-05 09:03:25.64', 'bigdata', NULL, NULL, 1, NULL);
INSERT INTO "industry_supervision_plan" ("id", "type", "unit", "name", "content", "level", "completion_time", "scene", "label", "annex", "release_time", "state", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "cb") VALUES ('26', '养护维修', NULL, '新宝界桥维修', '横隔梁维修、伸缩缝维修、梁体裂缝封闭、支座维修等', NULL, NULL, '5', NULL, NULL, NULL, '0', NULL, '2024-03-05 09:03:25.64', 'bigdata', NULL, NULL, 1, NULL);
INSERT INTO "industry_supervision_plan" ("id", "type", "unit", "name", "content", "level", "completion_time", "scene", "label", "annex", "release_time", "state", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "cb") VALUES ('28', '养护维修', NULL, '蠡湖大桥及枕溪桥引坡局部外倾栏杆改造', '蠡湖大桥：两侧栏杆铁件立杆和底梁重度锈蚀的部分进行更换（总长约800m），对机非隔离栏进行除锈油漆（总长1500m）。                             
枕溪桥： 将现有倾斜严重的引坡栏杆(共265m）拆除，重新制作钢筋砼挡墙基础，再将栏杆复原。', NULL, NULL, '5', NULL, NULL, NULL, '0', NULL, '2024-03-05 09:03:25.64', 'bigdata', NULL, NULL, 1, NULL);
INSERT INTO "industry_supervision_plan" ("id", "type", "unit", "name", "content", "level", "completion_time", "scene", "label", "annex", "release_time", "state", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "cb") VALUES ('48', '养护维修', NULL, '马蠡港桥整修', '1、全桥梁体混凝土缺陷294㎡。 
2、梁体裂缝维修104m。
3、梁体防腐涂装4500㎡，增加耐久性。
4、桥梁橡胶支座更换112个。', NULL, NULL, '5', NULL, NULL, NULL, '0', NULL, '2024-03-05 09:03:25.64', 'bigdata', NULL, NULL, 1, NULL);
INSERT INTO "industry_supervision_plan" ("id", "type", "unit", "name", "content", "level", "completion_time", "scene", "label", "annex", "release_time", "state", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "cb") VALUES ('16', '养护维修', NULL, '梁溪大桥维修', '梁溪大桥伸缩缝和桥面铺装改造；桥面沥青修复2600m2，非机动车道人行道防滑处理1600m2,伸缩缝维修，更换支座，梁体外表面清洗及涂装6100m2', NULL, NULL, '5', NULL, NULL, NULL, '0', NULL, '2024-03-05 09:03:25.64', 'bigdata', NULL, NULL, 1, NULL);
INSERT INTO "industry_supervision_plan" ("id", "type", "unit", "name", "content", "level", "completion_time", "scene", "label", "annex", "release_time", "state", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "cb") VALUES ('18', '养护维修', NULL, '锡宁路上跨通江大道锡澄桥梁维修', '对于＜0.15mm裂缝进行表面封闭，≥0.15mm裂缝进行压力灌浆，≥0.2mm裂缝，对板梁底板粘贴碳纤维加固；钢筋除锈重新，重做封锚砼，修补破损砼，补充缺失支座等', NULL, NULL, '5', NULL, NULL, NULL, '0', NULL, '2024-03-05 09:03:25.64', 'bigdata', NULL, NULL, 1, NULL);
INSERT INTO "industry_supervision_plan" ("id", "type", "unit", "name", "content", "level", "completion_time", "scene", "label", "annex", "release_time", "state", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "cb") VALUES ('52', '养护维修', NULL, '桥梁栏杆、防撞墙、桥墩桥台、装饰板清洗', '1、69344平方米栏杆清洗。
2、101354平方米防撞墙内侧迎车面、112038平方米防撞墙外侧面清洗。
3、216个桥墩桥台清洗；
4、6600平方米桥梁装饰板清洗；', NULL, NULL, '5', NULL, NULL, NULL, '0', NULL, '2024-03-05 09:03:25.64', 'bigdata', NULL, NULL, 1, NULL);
INSERT INTO "industry_supervision_plan" ("id", "type", "unit", "name", "content", "level", "completion_time", "scene", "label", "annex", "release_time", "state", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "cb") VALUES ('40', '养护维修', NULL, '北环线1#、2#人行天桥中修', '1、北环线1#人行天桥450m栏杆全部拆除更换
2、北环线2#人行天桥原玻璃及其框架拆除后增设竖杆加固，局部锈穿位置更换，450m栏杆除锈油漆', NULL, NULL, '5', NULL, NULL, NULL, '0', NULL, '2024-03-05 09:03:25.64', 'bigdata', NULL, NULL, 1, NULL);
INSERT INTO "industry_supervision_plan" ("id", "type", "unit", "name", "content", "level", "completion_time", "scene", "label", "annex", "release_time", "state", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "cb") VALUES ('43', '养护维修', NULL, '望山路人行天桥中修', '1、全部拆除桥底铝塑板，对人行天桥装饰件全部进行更换、加固、涂刷防锈漆，最后重新安装铝塑板。2、重铺面层445㎡', NULL, NULL, '5', NULL, NULL, NULL, '0', NULL, '2024-03-05 09:03:25.64', 'bigdata', NULL, NULL, 1, NULL);
INSERT INTO "industry_supervision_plan" ("id", "type", "unit", "name", "content", "level", "completion_time", "scene", "label", "annex", "release_time", "state", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "cb") VALUES ('45', '养护维修', NULL, '吴桥病害中修', '①裂缝处理：根据缝宽分别采取封缝和灌缝的措施。建议宽度＜0.15mm的裂缝采用封闭胶封闭处理，宽度≥0.15mm的裂缝采用压力灌胶处理。其中裂缝宽度＜0.15mm的长度约3360m，裂缝宽度≥0.15mm的长度约3055m。
②对于梁体底面裂缝较多、集中区域，在裂缝修补后，采用在底板粘贴碳纤维布进行加固处理。', NULL, NULL, '5', NULL, NULL, NULL, '0', NULL, '2024-03-05 09:03:25.64', 'bigdata', NULL, NULL, 1, NULL);
INSERT INTO "industry_supervision_plan" ("id", "type", "unit", "name", "content", "level", "completion_time", "scene", "label", "annex", "release_time", "state", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "cb") VALUES ('50', '养护维修', NULL, '枕溪桥吊杆维修', '枕溪桥64个上锚头混凝土止水处理，24根渗水吊杆钢索防锈维护和吊杆外套管中空防水处理', NULL, NULL, '5', NULL, NULL, NULL, '0', NULL, '2024-03-05 09:03:25.64', 'bigdata', NULL, NULL, 1, NULL);
INSERT INTO "industry_supervision_plan" ("id", "type", "unit", "name", "content", "level", "completion_time", "scene", "label", "annex", "release_time", "state", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "cb") VALUES ('51', '养护维修', NULL, '充山桥拆除重建', '拆除现状上部结构梁体以及现状台帽和部分桥台，采用 1-20m简支梁桥一跨过河，现状管线迁移', NULL, NULL, '5', NULL, NULL, NULL, '0', NULL, '2024-03-05 09:03:25.64', 'bigdata', NULL, NULL, 1, NULL);
INSERT INTO "industry_supervision_plan" ("id", "type", "unit", "name", "content", "level", "completion_time", "scene", "label", "annex", "release_time", "state", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "cb") VALUES ('30', '养护维修', NULL, '桥下空间整治', '1、对凤翔路上跨线桥、钱荣高架、景云立交、景渎立交、姚湾立交AB匝道、江尖大桥桥下桥门洞设置铁栅栏，铁栅栏合计962m；                                                                                     2、对惠农桥、金城大桥桥下砖砌围墙设置，共40m3；                                                                                                            3、吴桥东、西引桥桥下违建墙体、楼板首先进行拆除外运，东引桥桥下门洞设置铁栅栏围挡。西引桥桥下门洞进行砌筑砖墙、墙体粉刷、浇筑地坪等改造。（其中，吴桥东引桥墙体及楼板拆除约5800m2、铁栅栏围挡设置520m；吴桥西引桥违建拆除约2500m3、砌筑砖墙300m3、高度为墙体粉刷约8000m2等）', NULL, NULL, '5', NULL, NULL, NULL, '0', NULL, '2024-03-05 09:03:25.64', 'bigdata', NULL, NULL, 1, NULL);
INSERT INTO "industry_supervision_plan" ("id", "type", "unit", "name", "content", "level", "completion_time", "scene", "label", "annex", "release_time", "state", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "cb") VALUES ('33', '养护维修', NULL, '锡山大桥维修', '1、D80型钢伸缩缝更换：3000元/m*28m=8.4万元；伸缩缝橡胶条更换：212m*200元/m=4.24万；伸缩缝锚固区砼修补：2m2*1000元/m2=2000元；
2、非机动车道铺设环氧磨耗层：460元/m2*2300m2=105.8万元；  
3、人行梯道修复：640m2*410元/m2=26.24万元；人行梯道底面涂装：640m2*100元/m2=6.4万；人行梯道栏杆涂装：760m2*100元/m2=7.6万；
4、铰缝渗水注胶处理：1000元/m*120m=12万元；
5、梁体缺陷修复（环氧砂浆修复）：50m2*1650元/m2=8.25万元；
6、裂缝处理：130m*80元/m=1.04万元；
7、梁体顶升、支座及抗震挡块更换：12断面*4万元/断面=48万元；
8、梁体外表面清洗及涂装：150元/m2*2800m2=42万元；西广场1、2#孔T梁底部及1#墩全部涂装：1800m2*150元/m2=27万；
9、沥青维修 70元/m2*300m2=2.1万元；0#台背凿除及浇筑（1m高）：2万；0#台增设搭板费用：6万元；增加水穏基层：2万元   ；桥头开挖弃置及基地压实：5.5万元
10、桥检车、支架等措施费：37.28万元；
11、规费：352.05*0.05=17.6万元
12、税金：369.65*0.11=40.66万元
13、设计费、监理费、海事费等其他费用等40万', NULL, NULL, '5', NULL, NULL, NULL, '0', NULL, '2024-03-05 09:03:25.64', 'bigdata', NULL, NULL, 1, NULL);
INSERT INTO "industry_supervision_plan" ("id", "type", "unit", "name", "content", "level", "completion_time", "scene", "label", "annex", "release_time", "state", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "cb") VALUES ('21', '养护维修', NULL, '江尖大桥、体育场桥维修', '江尖大桥：1、快、慢车道伸缩缝改造92m。 2、对于宽度d＜0.15mm的裂缝，采用涂膜封闭法进行处理；对于宽度d≥0.15mm的裂缝，采用环氧树脂浆液进行低压注浆处理；3、对>0.2mm且位于底板跨中范围的裂缝进行粘贴碳纤维加固处理（2520平方）；4、桥面沥青和人行道局部修复；5、锈蚀栏杆除锈油漆。
体育场桥：对于宽度d＜0.15mm的裂缝（2160m），采用涂膜封闭法进行处理；对于宽度d≥0.15mm的裂缝（640m），采用环氧树脂浆液进行低压注浆处理；2.部分栏杆锈蚀严重处除锈并油漆；3、拱圈掉落外挂维修', NULL, NULL, '5', NULL, NULL, NULL, '0', NULL, '2024-03-05 09:03:25.64', 'bigdata', NULL, NULL, 1, NULL);
INSERT INTO "industry_supervision_plan" ("id", "type", "unit", "name", "content", "level", "completion_time", "scene", "label", "annex", "release_time", "state", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "cb") VALUES ('10', '养护维修', NULL, '桥梁支座更换', '桥梁支座更换', NULL, NULL, '5', NULL, NULL, NULL, '0', NULL, '2024-03-05 09:03:25.64', 'bigdata', NULL, NULL, 1, NULL);
INSERT INTO "industry_supervision_plan" ("id", "type", "unit", "name", "content", "level", "completion_time", "scene", "label", "annex", "release_time", "state", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "cb") VALUES ('35', '养护维修', NULL, '蓉湖大桥伸缩缝、主塔爬梯、引桥桥墩装饰板维修', '1、主桥D160型钢伸缩缝改造28米（采用快速水泥）、引桥D80型钢伸缩缝改造64米。59万
2、原装饰板支架面板拆除,支架制作安装及油漆,面板制作安装、喷漆及附件。48万
3、为方便主塔内部检查维修，对主塔内部爬梯进行改造。40万
4、蓉湖大桥箱室积水处理：对蓉湖大桥砼箱室原开口位置的裂缝进行压力灌缝处理，桥面沥青铣刨、铺装层维修、防水处理后重新摊铺沥青，桥面吊杆护套结合部位密封处理。5万
5、措施费、设计费、监理费等其他费用等：48万
', NULL, NULL, '5', NULL, NULL, NULL, '0', NULL, '2024-03-05 09:03:25.64', 'bigdata', NULL, NULL, 1, NULL);
INSERT INTO "industry_supervision_plan" ("id", "type", "unit", "name", "content", "level", "completion_time", "scene", "label", "annex", "release_time", "state", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "cb") VALUES ('12', '养护维修', NULL, '金城大桥、312国道通江大道、锡澄路主线上跨桥、石门路桥、惠通桥加固', '1、金城大桥:腹板裂缝宽度fw≥0.15mm的采用灌缝处理，灌浆约50m，并沿着腹板斜向裂缝垂直方向粘贴钢板加固，钢板加固240m2;
2、312国道通江大道、锡澄路主线上跨桥裂缝进行修补处理:
3、石门路桥:凿除并重新浇筑砼铺装层，面积约374m2:
4、惠通桥:凿除并重新浇筑沥青路面、砼铺装层，面积约690m2', NULL, NULL, '5', NULL, NULL, NULL, '0', NULL, '2024-03-05 09:03:25.64', 'bigdata', NULL, NULL, 1, NULL);
INSERT INTO "industry_supervision_plan" ("id", "type", "unit", "name", "content", "level", "completion_time", "scene", "label", "annex", "release_time", "state", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "cb") VALUES ('17', '养护维修', NULL, '华清大桥维修', '纵横钢梁防腐涂装；裂缝封闭；∏形保护板恢复，系杆吊杆除锈，系杆保护钢箱及支承架增设，吊杆防腐，缠裹PVF带等', NULL, NULL, '5', NULL, NULL, NULL, '0', NULL, '2024-03-05 09:03:25.64', 'bigdata', NULL, NULL, 1, NULL);
INSERT INTO "industry_supervision_plan" ("id", "type", "unit", "name", "content", "level", "completion_time", "scene", "label", "annex", "release_time", "state", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "cb") VALUES ('14', '养护维修', NULL, '市管桥梁桥洞维护', '对景云立交、盛新大桥、清宁大桥等桥梁桥洞进行围挡，安装金属网护栏，C20砼基础;约封闭2500米，200元/m', NULL, NULL, '5', NULL, NULL, NULL, '0', NULL, '2024-03-05 09:03:25.64', 'bigdata', NULL, NULL, 1, NULL);
INSERT INTO "industry_supervision_plan" ("id", "type", "unit", "name", "content", "level", "completion_time", "scene", "label", "annex", "release_time", "state", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "cb") VALUES ('19', '养护维修', NULL, '山北大桥维修', '山北大桥：箱梁内砼维修，钢筋防腐涂装，挂梁检测维修', NULL, NULL, '5', NULL, NULL, NULL, '0', NULL, '2024-03-05 09:03:25.64', 'bigdata', NULL, NULL, 1, NULL);
INSERT INTO "industry_supervision_plan" ("id", "type", "unit", "name", "content", "level", "completion_time", "scene", "label", "annex", "release_time", "state", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "cb") VALUES ('20', '养护维修', NULL, '钢铁桥维修', '中跨板梁支座全部更换及其余病害维修，边跨上部结构拆除重建，更换人行道', NULL, NULL, '5', NULL, NULL, NULL, '0', NULL, '2024-03-05 09:03:25.64', 'bigdata', NULL, NULL, 1, NULL);
INSERT INTO "industry_supervision_plan" ("id", "type", "unit", "name", "content", "level", "completion_time", "scene", "label", "annex", "release_time", "state", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "cb") VALUES ('22', '养护维修', NULL, '金城大桥裂缝、
蠡踪桥桥面、', '1、金城大桥：腹板裂缝宽度fw≥0.15mm的采用灌缝处理，灌浆约50m，并沿着腹板斜向裂缝垂直方向粘贴钢板加固，钢板加固约240m2；右幅2-1-33#支座更换。
2、蠡综桥铣刨沥青、凿除混凝土铺装层，重新浇筑混凝土铺装层、摊铺沥青砼。（面积630m2)', NULL, NULL, '5', NULL, NULL, NULL, '0', NULL, '2024-03-05 09:03:25.64', 'bigdata', NULL, NULL, 1, NULL);
INSERT INTO "industry_supervision_plan" ("id", "type", "unit", "name", "content", "level", "completion_time", "scene", "label", "annex", "release_time", "state", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "cb") VALUES ('46', '养护维修', NULL, '城市桥梁安全隐患整治', '1、锈蚀栏杆更换、油漆；80万元
2、桥栏杆除锈油漆，更换瓷砖和防滑条。50万元。           3、凤翔高架跨铁路段153m+11m防抛网改造；金城公铁立交跨铁路段247m+27m防抛网改造；金城公铁立交慢行系统：对522m防抛网改造；景云立交：634m防抛网进行改造，200万元。                                                                                4、枕溪桥64个上锚头混凝土止水处理，24根渗水吊杆钢索防锈维护和吊杆外套管中空防水处理。100万元
5、充山桥拆除重建100万元
6、惠商桥拆除重建150万元', NULL, NULL, '5', NULL, NULL, NULL, '0', NULL, '2024-03-05 09:03:25.64', 'bigdata', NULL, NULL, 1, NULL);
INSERT INTO "industry_supervision_plan" ("id", "type", "unit", "name", "content", "level", "completion_time", "scene", "label", "annex", "release_time", "state", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "cb") VALUES ('47', '养护维修', NULL, '槐古大桥病害整修', '一、桥面系：800万
1、慢车道面层改造3560m2。
2、桥面栏杆：（1）花岗岩锈石维修218m。（2）栏杆底座贴面砖拆除更换943m。(3)栏杆更新1045m
3、伸缩缝：慢车道伸缩缝更换60m。
4、梯道：四角梯道栏杆全部更换170m。
二、上下部结构：200万
1、梁体裂缝进行维修，局部进行防腐涂装。
三、支座100万
1、全桥板式橡胶支座更换更换144个。
2、盆式支座防护罩更换更换55个。
', NULL, NULL, '5', NULL, NULL, NULL, '0', NULL, '2024-03-05 09:03:25.64', 'bigdata', NULL, NULL, 1, NULL);
INSERT INTO "industry_supervision_plan" ("id", "type", "unit", "name", "content", "level", "completion_time", "scene", "label", "annex", "release_time", "state", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "cb") VALUES ('31', '养护维修', NULL, '蠡湖大桥维修', '蠡湖大桥维修占道施工与蠡湖大道快速化改造同步进行', NULL, NULL, '5', NULL, NULL, NULL, '0', NULL, '2024-03-05 09:03:25.64', 'bigdata', NULL, NULL, 1, NULL);
INSERT INTO "industry_supervision_plan" ("id", "type", "unit", "name", "content", "level", "completion_time", "scene", "label", "annex", "release_time", "state", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "cb") VALUES ('34', '养护维修', NULL, '2017年桥门洞围挡', '对凤翔路上跨线桥、姚湾立交B匝道、会龙桥、红星桥、清宁大桥、古运河桥、北环线1号人行天桥、北环线2号人行天桥、寺头港左右辅道桥、梁中桥、广南立交、亭子桥、东汀河桥、安福桥等14座桥梁桥洞易占用、堆积部位设置桥门洞围挡，围挡形式采用钢丝围栏、砖砌围墙两种形式，约1100m。', NULL, NULL, '5', NULL, NULL, NULL, '0', NULL, '2024-03-05 09:03:25.64', 'bigdata', NULL, NULL, 1, NULL);
INSERT INTO "industry_supervision_plan" ("id", "type", "unit", "name", "content", "level", "completion_time", "scene", "label", "annex", "release_time", "state", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "cb") VALUES ('36', '养护维修', NULL, '2017年支座更换', '1、凤翔路高架桥：盆式支座更换13只（四氟板脱落、钢板错位量大），顶升断面共7个；                                                                                                                    
2、瞻江立交：盆式橡胶支座更换26只（安装方向错误），顶升断面共18个；                                                                                                             3、凤翔立交：盆式橡胶支座更换8只（安装方向错误），顶升断面共4个。 
10万/个*29个=290万
措施费、设计费、监理费等其他费用等10万', NULL, NULL, '5', NULL, NULL, NULL, '0', NULL, '2024-03-05 09:03:25.64', 'bigdata', NULL, NULL, 1, NULL);
INSERT INTO "industry_supervision_plan" ("id", "type", "unit", "name", "content", "level", "completion_time", "scene", "label", "annex", "release_time", "state", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "cb") VALUES ('41', '养护维修', NULL, '桥门洞围挡中修', '对江尖大桥、新扬大桥等桥梁桥洞易占用、堆积部位进行清理并设置桥门洞围挡，围挡形式采用钢丝围栏、砖砌围墙两种形式，共计长度约1000m', NULL, NULL, '5', NULL, NULL, NULL, '0', NULL, '2024-03-05 09:03:25.64', 'bigdata', NULL, NULL, 1, NULL);
INSERT INTO "industry_supervision_plan" ("id", "type", "unit", "name", "content", "level", "completion_time", "scene", "label", "annex", "release_time", "state", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "cb") VALUES ('49', '养护维修', NULL, '开源大桥整修', '一）桥面系
1、全桥环氧覆层拆除后，对混凝土表面进行抛丸处理，基面局部破损区域修补后重新铺设7mm厚环氧覆层，维修面积约9119㎡
2、两侧快车道最右侧车道沥青铺装打开后检查预应力构件，混凝土铺装表面防水处理后，采用抗车辙沥青重铺，面积约6820㎡
3、由西往东2#慢车道型钢伸缩缝拆除更换，共计5.5m。
4、全桥声屏障全长344m，声屏障（迎车面）上下屏体表面涂装出新500m2
5、装饰板维修，拆除开源大桥装饰板，新建装饰铝板
6、栏杆涂装，将主桥、引桥、梯道、防撞墙钢扶手栏杆及机非分隔栏涂装表面清理除锈后，重新进行防腐涂装
7、将钢拱圈表面除锈、混凝土拱座及中分带表面进行清理后重新进行防腐涂装
（二）上下部结构
1、箱室内裂缝维修，裂缝宽度＜0.15mm裂缝采用封闭处理，共21.2m，裂缝宽度≥0.15mm裂缝采用灌缝处理，共32.7m；箱室内裂缝部位钢板黏贴加固，共80㎡。
2、吊杆上下锚头检修56个，体外预应力下锚头检修30个。
（三）支座
搭设脚手架平台，桥梁同步顶升，7个盆式支座进行更换。', NULL, NULL, '5', NULL, NULL, NULL, '0', NULL, '2024-03-05 09:03:25.64', 'bigdata', NULL, NULL, 1, NULL);
INSERT INTO "industry_supervision_plan" ("id", "type", "unit", "name", "content", "level", "completion_time", "scene", "label", "annex", "release_time", "state", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "cb") VALUES ('29', '养护维修', NULL, '支座更换', '对上述桥梁支座进行梁体顶升后的支座更换，确保桥梁在健康状况下安全运行。支座更换数量如下：                                                                               1、蠡湖大桥：GJZF4板式橡胶支座更换10只（支座开裂）；                                                                                                                          2、凤翔路高架桥：盆式支座更换5只（四氟板脱落、钢板错位）；                                                                                                                     3、民丰桥：板式橡胶支座更换1只（支座脱空8cm） 。                                                                         ', NULL, NULL, '5', NULL, NULL, NULL, '0', NULL, '2024-03-05 09:03:25.64', 'bigdata', NULL, NULL, 1, NULL);
INSERT INTO "industry_supervision_plan" ("id", "type", "unit", "name", "content", "level", "completion_time", "scene", "label", "annex", "release_time", "state", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "cb") VALUES ('32', '养护维修', NULL, '吴桥病害维修', '1、西引桥5-8#孔梁体砼凿除（3~5cm厚）、清理、运输（30m3）；结构胶修补(680m2)；碳布粘贴（1360m2)；碳布涂装（2434m2)。270万
2、裂缝封闭（500m)；裂缝灌注处理（1000m）；梁体混凝土缺陷修复（12m2）24万
3、东引桥裂缝较多处粘贴碳布（3508m2)；左右幅翼板连接段裂缝较多段及三道裂缝宽度较大处粘贴钢板（75.75m2）178万
4、支座顶升更换40万
5、伸缩缝渗水、锚固区破损部分砼修复；4个楼梯栏杆砼维修；沥青铣刨维修19万
6、支架搭设规费税金等120万
7、海事费、设计费、监理费等其他费用等49万', NULL, NULL, '5', NULL, NULL, NULL, '0', NULL, '2024-03-05 09:03:25.64', 'bigdata', NULL, NULL, 1, NULL);
INSERT INTO "industry_supervision_plan" ("id", "type", "unit", "name", "content", "level", "completion_time", "scene", "label", "annex", "release_time", "state", "order_num", "create_time", "create_user", "update_time", "update_user", "del_flag", "cb") VALUES ('37', '养护维修', NULL, '老宝界桥中修', '1、上部结构： 
①裂缝处理：封缝、灌缝，共5800m。                                                                    ②对于存在横向裂缝、纵向裂缝和网裂现象，粘贴一层碳纤维布，约600m2。                                                                                                                                                 ③ 对于部分破损露筋或钢筋锈胀情况，应先除锈后进行聚合物砂浆修补，约500m2。                                                                                               
④通航孔的梁体聚合物砂浆修补、粘贴U型钢板50m2、设置标志标牌1套。                                                                                                                  2、下部结构：
①所有墩梁固结处粘贴一层碳纤维布，约200m2。
②桥墩底部应凿除松散混凝土，出现露筋的构件进行除锈后用聚合物砂浆修复，约200m2。                                                                                                                                          ③裂缝处理约1600m。
④所有发生病害的支座进行顶升更换，并用支座专用修补胶修补支座垫石。 ', NULL, NULL, '5', NULL, NULL, NULL, '0', NULL, '2024-03-05 09:03:25.64', 'bigdata', NULL, NULL, 1, NULL);
