<template>
  <div id="app">
    <keep-alive>
      <router-view v-if="$route.meta.keepAlive" />
    </keep-alive>
    <router-view v-if="!$route.meta.keepAlive" />
  </div>
</template>

<script>
export default {
    name: 'App'
}
</script>
<style >
#app:before{
    content: url('./views/life-line/image/bigBg.png');
    display: none;
}
::-webkit-scrollbar {
  width: 6px;
  height:30px;

}
::-webkit-scrollbar-thumb {
  background-color: rgba(241, 153, 4, 1);
  border-radius: 3px;
}

.el-table__body-wrapper::-webkit-scrollbar {
  width: 8px;
  height: 8px;
}

.el-table__body-wrapper::-webkit-scrollbar-thumb {
  background-color: rgba(241, 153, 4, 1);
  border-radius: 3px;
}
.el-select-dropdown ::-webkit-scrollbar{
  width: 6px;
  height:6px;
}
</style>
